<template>
  <div class="h-92% overflow-auto mt-10px mb-10px">
    <table style="width: 740pt">
      <colgroup>
        <col width="16" style="width: 9.75pt" span="28" />
        <col width="31" style="width: 18.9pt" />
        <col width="16" style="width: 9.75pt" span="23" />
      </colgroup>
      <tbody>
        <tr height="30">
          <td colspan="52" class="et29 bg0">主要通风机参数</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et3">地点</td>
          <td colspan="11" class="et3">型号</td>
          <td colspan="8" class="et3">电机功率</td>
          <td colspan="7" class="et3">最大风量</td>
          <td colspan="8" class="et3">实际风量</td>
          <td colspan="8" class="et3">负压（Pa）</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et22">明安木独</td>
          <td colspan="11" class="et22">FBCDZ-10-NO.36</td>
          <td colspan="8" class="et22">2×800</td>
          <td colspan="7" class="et22">23400</td>
          <td colspan="8" class="et22">18857</td>
          <td colspan="8" class="et22">2280</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et22">松定霍洛</td>
          <td colspan="11" class="et22">FBCDZ-10-NO.34</td>
          <td colspan="8" class="et22">2×560</td>
          <td colspan="7" class="et22">18000</td>
          <td colspan="8" class="et22">12867</td>
          <td colspan="8" class="et22">1500</td>
        </tr>
        <tr height="30">
          <td colspan="52" rowspan="2" class="et3"
            >主要通风机型号含义：F(风机）B（防爆）C（抽出式）D（对旋）Z（主要通风机）10(电机的转速,指10级电机,590转/min）No36（指36号风机,36代表扇叶直径3米6）</td
          >
        </tr>
        <tr height="30"> </tr>
        <tr height="30">
          <td colspan="10" rowspan="2" class="et21"><img src="./images/formula0.png" /></td>
          <td colspan="4" rowspan="2" class="et22">输入功率</td>
          <td colspan="14" rowspan="2" class="et22"><img src="./images/formula1.png" /></td>
          <td colspan="4" rowspan="2" class="et22">输出功率</td>
          <td colspan="10" rowspan="2" class="et21"><img src="./images/formula2.png" /></td>
          <td colspan="10" rowspan="2" class="et22">效率分静压效率和全压效率</td>
        </tr>
        <tr height="30"> </tr>
        <tr height="30">
          <td colspan="52" class="et29 bg0">通风系统</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et21">进风井</td>
          <td colspan="6" class="et21">风量</td>
          <td colspan="10" class="et21">回风井</td>
          <td colspan="6" class="et21">风量</td>
          <td colspan="9" class="et3">综采面</td>
          <td colspan="11" class="et21">配风量</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et22">辅运平硐</td>
          <td colspan="6" class="et22">9542</td>
          <td colspan="7" rowspan="3" class="et22">明安木独 回风立井</td>
          <td colspan="3" rowspan="2" class>22煤</td>
          <td colspan="6" rowspan="2" class="et22">7695</td>
          <td colspan="9" class="et22">12201综采面</td>
          <td colspan="11" class="et21">1036</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et22">主斜井</td>
          <td colspan="6" class="et22">3939</td>
          <td colspan="9" class="et22">42204综放面</td>
          <td colspan="11" class="et21">1750</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et22">工业广场进风斜井</td>
          <td colspan="6" class="et22">339</td>
          <td colspan="3" class="et22">12煤</td>
          <td colspan="6" class="et22">11162</td>
          <td colspan="9" class="et22">12上302综放面</td>
          <td colspan="11" class="et21">1788</td>
        </tr>
        <tr height="30">
          <td colspan="7" rowspan="2" class="et22">松定霍洛 进风立井</td>
          <td colspan="3" class="et22">22煤</td>
          <td colspan="6" class="et22">7132</td>
          <td colspan="7" rowspan="2" class="et22">松定霍洛 回风立井</td>
          <td colspan="3" class="et22">22煤</td>
          <td colspan="6" class="et22">2098</td>
          <td colspan="20" rowspan="3" class>等积孔14.2；＜1困难、1-2中等、＞2容易。</td>
        </tr>
        <tr height="30">
          <td colspan="3" class="et22">42煤</td>
          <td colspan="6" class="et22">9831</td>
          <td colspan="3" class="et22">42煤</td>
          <td colspan="6" class="et22">10769</td>
        </tr>
        <tr height="30">
          <td colspan="10" class="et22">总计</td>
          <td colspan="6" class="et22">30783</td>
          <td colspan="10" class="et22">总计</td>
          <td colspan="6" class="et22">31724</td>
        </tr>
        <tr height="30">
          <td colspan="13" class="et21">通风巷道米数</td>
          <td colspan="14" class="et21">通风阻力测定数据</td>
          <td colspan="4" rowspan="2" class="et22">自然风压</td>
          <td colspan="11" rowspan="2" class="et22"><img src="./images/formula3.png" /></td>
          <td colspan="10" rowspan="2" class="et22">井口两侧空气单位面积重力差</td>
        </tr>
        <tr height="30">
          <td colspan="8" class="et22">12上煤</td>
          <td colspan="5" class="et22">45260</td>
          <td colspan="6" class="et21">检测时间</td>
          <td colspan="8" class="et21">2021.11.19</td>
        </tr>
        <tr height="30">
          <td colspan="8" class="et22">12煤</td>
          <td colspan="5" class="et22">15414</td>
          <td colspan="6" class="et21">检验周期</td>
          <td colspan="8" class="et21">三年</td>
          <td colspan="16" class="et22">风速测定</td>
          <td colspan="9" class="et22">主扇性能测定</td>
        </tr>
        <tr height="30">
          <td colspan="8" class="et22">22煤三盘区</td>
          <td colspan="5" class="et22">14477</td>
          <td colspan="6" class="et21">矿总风阻</td>
          <td colspan="8" class="et21">0.015Ns2/m8</td>
          <td colspan="4" class="et22">风表</td>
          <td colspan="6" class="et22">测量范围</td>
          <td colspan="6" class="et22">启动风速</td>
          <td colspan="9" class="et21">检测时间</td>
        </tr>
        <tr height="31">
          <td colspan="8" class="et22">22下煤二盘区</td>
          <td colspan="5" class="et21">1374</td>
          <td colspan="3" rowspan="3" class="et22">自然 风压</td>
          <td colspan="6" rowspan="2" class="et22">明安木独 回风立井</td>
          <td colspan="5" rowspan="2" class="et21">141.51</td>
          <td colspan="4" rowspan="2" class="et21">低</td>
          <td colspan="6" rowspan="2" class="et21">0.3-5m/s</td>
          <td colspan="6" rowspan="2" class="et21">≤0.2m/s</td>
          <td colspan="9" rowspan="2" class="et22">松定霍洛：2022.07.29 明安木独：2023.11.15</td>
        </tr>
        <tr height="40">
          <td colspan="8" class="et22">22煤二盘区</td>
          <td colspan="5" class="et22">36667</td>
        </tr>
        <tr height="51">
          <td colspan="8" class="et22">22煤一盘区</td>
          <td colspan="5" class="et22">18914</td>
          <td colspan="6" class="et22">松定霍洛 回风立井</td>
          <td colspan="5" class="et21">157.61</td>
          <td colspan="4" class="et22">中</td>
          <td colspan="6" class="et22">0.5-10m/s</td>
          <td colspan="6" class="et22">≤0.4m/s</td>
          <td colspan="9" class="et21">检测周期</td>
        </tr>
        <tr height="30">
          <td colspan="8" class="et22">42煤二盘区</td>
          <td colspan="5" class="et22">52309</td>
          <td colspan="14" class="et22">等积孔</td>
          <td colspan="4" class="et22">高</td>
          <td colspan="6" class="et22">0.8-25m/s</td>
          <td colspan="6" class="et22">≤0.6m/s</td>
          <td colspan="9" class="et21">3年</td>
        </tr>
        <tr height="30">
          <td colspan="8" class="et22">42煤一盘区</td>
          <td colspan="5" class="et22">23833</td>
          <td colspan="14" rowspan="2" class="et22"><img src="./images/formula4.png" /></td>
          <td colspan="8" class="et21">测量方法</td>
          <td colspan="8" class="et21">侧身法</td>
          <td colspan="9" class="et21">测定角度</td>
        </tr>
        <tr height="30">
          <td colspan="8" class="et22">全矿(含立井)</td>
          <td colspan="5" class="et22">217284</td>
          <td colspan="8" class="et22">校正系数</td>
          <td colspan="8" class="et22">（s-0.4）/s</td>
          <td colspan="9" class="et21">3个</td>
        </tr>
        <tr height="30">
          <td colspan="52" class="et29 bg0">通风设施</td>
        </tr>
        <tr height="30">
          <td colspan="11" class="et21">一般防火密闭设计</td>
          <td colspan="11" class="et21">永久防火密闭设计</td>
          <td colspan="7" class="et22">永久防火密闭</td>
          <td colspan="5" class="et21">12</td>
          <td colspan="18" rowspan="2" class="et22">维修三厂出厂价格</td>
        </tr>
        <tr height="30">
          <td colspan="11" rowspan="5" class="et22">1米砼闭+1米黄土+0.5米砖闭+1.5米砼闭</td>
          <td colspan="11" rowspan="5" class="et22">0.37米砖闭+0.5米砼闭+3.5米黄土+0.5米砖闭+1.5米砼闭</td>
          <td colspan="7" class="et22">一般防火密闭</td>
          <td colspan="5" class="et21">143</td>
        </tr>
        <tr height="30">
          <td colspan="7" class="et22">临时密闭</td>
          <td colspan="5" class="et21">468</td>
          <td colspan="9" class="et22">竹制行人风门</td>
          <td colspan="5" class="et21">1.2*1.6</td>
          <td colspan="4" class="et21">7765</td>
        </tr>
        <tr height="30">
          <td colspan="7" class="et22">行车风门</td>
          <td colspan="5" class="et21">103</td>
          <td colspan="9" rowspan="2" class="et22">竹制行车风门</td>
          <td colspan="5" class="et21">3.3*2.7</td>
          <td colspan="4" class="et21">17174</td>
        </tr>
        <tr height="30">
          <td colspan="7" class="et22">行人风门</td>
          <td colspan="5" class="et21">87</td>
          <td colspan="5" class="et21">4.2*2.8</td>
          <td colspan="4" class="et21">18612</td>
        </tr>
        <tr height="30">
          <td colspan="7" class="et22">风桥</td>
          <td colspan="5" class="et21">62</td>
          <td colspan="9" class="et22">自动风门</td>
          <td colspan="5" class="et21">5.0*3.0</td>
          <td colspan="4" class="et21">1.32万</td>
        </tr>
      </tbody>
    </table>
  </div>
</template>
<script lang="ts" setup>
  // 转换工具 https://www.lingdaima.com/table/
</script>
<style scoped>
  table {
    border-top: 1px solid #333;
    border-left: 1px solid #333;
    border-spacing: 0;
    background-color: #ddd;
    width: 100%;
    color: #000;
    margin: 0 auto;
  }
  table td {
    border-bottom: 1px solid #333;
    border-right: 1px solid #333;
    font-size: 13px;
    padding: 5px;
  }
  .et42 {
    text-align: center;
  }
  .et5 {
    text-align: left;
  }
  .et6 {
    text-align: left;
  }
  .et22 {
    text-align: center;
  }
  .et29 {
    text-align: center;
  }
  /* .font0 {
  } */
  .bg0 {
    background-color: #333;
    color: #fff;
  }
</style>
