<template>
  <div class="nitrogen-history">
    <!-- <HistoryTable columns-type="forcFan" device-type="forcFan" designScope="forcFan_history" :scroll="{ y: 650 }" /> -->
    <HistoryTable device-code="forcFan" dict-code="forcFan_dict" columns-code="forcFan_history" />
  </div>
</template>
<script setup lang="ts">
  // import HistoryTable from '../../comment/HistoryTable.vue';
  import HistoryTable from '/@/views/vent/comment/history/HistoryTable.vue';
</script>
<style lang="less" scoped>
  .nitrogen-history {
    position: fixed;
    top: 80px;
    margin-top: 20px;
  }
</style>
