<template>
  <div class="warn-detail-table">
    <a-tabs v-model:activeKey="activeKey">
      <a-tab-pane key="1" tab="装备运行异常历史数据">
        <zqHistoryExport :isShowIcon="true" :tableColumn="columnZy"></zqHistoryExport>
      </a-tab-pane>
      <a-tab-pane key="2" tab="环境监测异常历史数据">
        <zqHistoryExport :isShowIcon="true" :tableColumn="columnCc"></zqHistoryExport>
      </a-tab-pane>
      <a-tab-pane key="3" tab="信号传输异常历史数据">
        <zqHistoryExport :isShowIcon="true" :tableColumn="columnCc"></zqHistoryExport>
      </a-tab-pane>
    </a-tabs>
  </div>
</template>

<script setup lang='ts'>
import { ref } from 'vue'
import zqHistoryExport from './zqHistoryExport.vue'
import { columnZy, columnCc } from './gasInject.data'

let activeKey = ref('1')
</script>

<style lang="less" scoped>
.warn-detail-table {
  width: 100%;
  height: 100%;
  padding: 20px;
  box-sizing: border-box;
}
</style>
