<template>
  <div class="handle-history">
    <HandlerHistoryTable
      columns-type="operator_history"
      device-type="sys_surface_caimei"
      :device-list-api="getTableList.bind(null, { strtype: 'pressurefan' })"
      designScope="pressurefan_history"
    />
  </div>
</template>
<script setup lang="ts">
  import HandlerHistoryTable from '../../comment/HandlerHistoryTable.vue';
  import { getTableList } from '../balancePress.api';
  const props = defineProps({
    deviceType: {
      type: String,
      required: true,
    },
    deviceId: {
      type: String,
      required: true,
    },
  });
</script>
<style lang="less" scoped>
  .handle-history {
    width: 100%;
    pointer-events: auto;
  }
</style>
