<template>
  <div class="handle-history">
    <HandlerHistoryTable columns-type="operatorhistory" device-type="pressurefan"
      :device-list-api="getTableList.bind(null, { strtype: 'pressurefan' })" designScope="pressurefan_history" />
  </div>
</template>
<script setup lang="ts">
import HandlerHistoryTable from '../../comment/HandlerHistoryTable.vue';
import { getTableList } from '../grout.api'
  const props = defineProps({
    deviceType: {
      type: String,
      required: true,
    },
    deviceId: {
      type: String,
      required: true,
    }
  })
</script>
<style lang="less" scoped>
.handle-history {
  pointer-events: auto;
}
</style>