<template>
  <div
    id="nitrogenCss3D"
    class="threejs-Object-CSS"
    style="width: 100%; height: 100%; position: absolute; pointer-events: none; overflow: hidden; z-index: 2; top: 0px; left: 0px"
  >
    <a-spin :spinning="loading" />
    <template>
      <div v-for="groupNum in monitorDataGroupNum" :key="groupNum" class="modal-monitor">
        <fourBorderBg :class="`kyj${groupNum}`" :id="`nitrogenMonitor${groupNum}`">
          <div class="title">{{ monitorData[groupNum - 1]['strname'] }} </div>
          <div class="monitor-item">
            <span class="monitor-title">排气压力:</span>
            <span class="monitor-val"
              ><span class="val">{{
                monitorData[groupNum - 1]['AirCompressor_ExhaustPre'] ? monitorData[groupNum - 1]['AirCompressor_ExhaustPre'] : '-'
              }}</span
              ><span class="unit">kPa</span></span
            >
          </div>
          <div class="monitor-item">
            <span class="monitor-title">累计流量:</span>
            <span class="monitor-val"
              ><span class="val">{{ monitorData[groupNum - 1]['FluxTotal1'] ? monitorData[groupNum - 1]['FluxTotal1'] ?  parseFloat(monitorData[groupNum - 1]['FluxTotal1']).toFixed(2) : '-' : '-' }}</span
              ><span class="unit">m³/h</span></span
            >
          </div>
          <div class="monitor-item">
            <span class="monitor-title">氮气纯度:</span>
            <span class="monitor-val"
              ><span class="val">{{ monitorData[groupNum - 1]['NitrogenPurity'] ? monitorData[groupNum - 1]['NitrogenPurity'] ? parseFloat(monitorData[groupNum - 1]['NitrogenPurity']).toFixed(2) : '-' : '-' }}</span
              ><span class="unit">%</span></span
            >
          </div>
          <div class="monitor-item">
            <span class="monitor-title">运行时间:</span>
            <span class="monitor-val"
              ><span class="val">{{
                monitorData[groupNum - 1]['AirCompressor_RunTime'] ? monitorData[groupNum - 1]['AirCompressor_RunTime'] : '-'
              }}</span
              ><span class="unit">h</span></span
            >
          </div>
          <div class="monitor-item">
            <span class="monitor-title">加载时间:</span>
            <span class="monitor-val"
              ><span class="val">{{
                monitorData[groupNum - 1]['AirCompressor_LoadTime'] ? monitorData[groupNum - 1]['AirCompressor_LoadTime'] : '-'
              }}</span
              ><span class="unit">h</span></span
            >
          </div>
        </fourBorderBg>
      </div>
    </template>
  </div>
  <div id="nitrogen3D" style="width: 100%; height: 100%; position: absolute; overflow: hidden"></div>
  <div class="nitrogen-home">
    <div class="nitrogen-container">
      <div class="top-box">
        <!-- 左边监测数据 -->
        <div class="lr-box left-box">
          <div class="item item-l" v-for="groupNum in monitorDataGroupNum" :key="groupNum">
            <ventBox1>
              <template #title>
                <div>{{ monitorData[groupNum - 1]['strname'] }}</div>
              </template>
              <template #container>
                <div class="monitor-box">
                  <div class="parameter-title group-parameter-title">
                    <SvgIcon class="icon" size="38" name="device-group-paramer" /><span>机组参数</span>
                  </div>
                  <div class="state-item" v-for="(data, index) in groupParameterData" :key="index">
                    <div class="item-col">
                      <span class="state-title">{{ Object.values(data)[0] }} :</span>
                      <span class="state-val">{{
                        (monitorData.length > 0 && monitorData[groupNum - 1][Object.keys(data)[0]]) >= 0
                          ? monitorData[groupNum - 1][Object.keys(data)[0]] ?  parseFloat(monitorData[groupNum - 1][Object.keys(data)[0]]).toFixed(2) : '-'
                          : '-'
                      }}</span>
                    </div>
                    <div class="item-col" v-if="Object.keys(data)[1]">
                      <span class="state-title">{{ Object.values(data)[1] }} :</span>
                      <span class="state-val">{{
                        (monitorData.length > 0 && monitorData[groupNum - 1][Object.keys(data)[1]]) >= 0
                          ? monitorData[groupNum - 1][Object.keys(data)[1]] ? parseFloat(monitorData[groupNum - 1][Object.keys(data)[1]]).toFixed(2) : '-'
                          : '-'
                      }}</span>
                    </div>
                  </div>
                </div>
                <div class="monitor-box">
                  <div class="parameter-title device-parameter-title">
                    <SvgIcon class="icon" size="32" name="device-paramer" /><span>空压机数据</span>
                  </div>
                  <div class="state-item" v-for="(data, index) in deviceParameterData" :key="index">
                    <div class="item-col">
                      <span class="state-title">{{ Object.values(data)[0] }} :</span>
                      <span class="state-val">{{
                        (monitorData.length > 0 && monitorData[groupNum - 1][Object.keys(data)[0]]) >= 0
                          ? monitorData[groupNum - 1][Object.keys(data)[0]]
                          : '-'
                      }}</span>
                    </div>
                    <div class="item-col" v-if="Object.keys(data)[1]">
                      <span class="state-title">{{ Object.values(data)[1] }} :</span>
                      <span class="state-val">{{
                        (monitorData.length > 0 && monitorData[groupNum - 1][Object.keys(data)[1]]) >= 0
                          ? monitorData[groupNum - 1][Object.keys(data)[1]]
                          : '-'
                      }}</span>
                    </div>
                  </div>
                </div>
              </template>
            </ventBox1>
          </div>
        </div>
        <!-- 右边控制状态 -->
        <div class="lr-box right-box">
          <ventBox1>
            <template #title>
              <div>远程控制</div>
            </template>
            <template #container>
              <div class="control-group">
                <div class="control-item" v-for="(groupNum, index) in monitorDataGroupNum" :key="groupNum">
                  <div class="control-item-title">{{ monitorData[groupNum - 1]['strname'] }}</div>
                  <div class="control-item-state">
                    <!-- <a-switch
                      v-model="airCompressorState[groupNum - 1][`compressRunSigF1`]"
                      size="small"
                      checked-children="开启"
                      un-checked-children="关闭"
                      :disabled="airCompressorState[groupNum - 1][`controlModel`]"
                      @change="handlerDevice(airCompressorState[groupNum - 1], index)"
                    /> -->
                    <a-button v-if="index==0" size="small"  type="text" style="color: #fff;" @click="handlerDevice(airCompressorState[groupNum - 1],false)">一键启停</a-button>
                    <a-button v-else size="small"  type="text" style="color: #fff;" @click="handlerDevice(airCompressorState[groupNum - 1], false)">一键启停</a-button>
                 
                  </div>
                </div>
                <div class="control-item" v-for="(groupNum, index) in monitorDataGroupNum" :key="groupNum">
                  <div class="control-item-title">{{ monitorData[groupNum - 1]['strname'] }}</div>
                  <div class="control-item-state">
                    <!-- <a-switch
                      v-model="airCompressorState[groupNum - 1][`compressRunSigF1`]"
                      size="small"
                      checked-children="开启"
                      un-checked-children="关闭"
                      :disabled="airCompressorState[groupNum - 1][`controlModel`]"
                      @change="handlerDevice(airCompressorState[groupNum - 1], index)"
                    /> -->
                    <a-button v-if="index==0" size="small"  type="text" style="color: #fff;" @click="handlerDevice(airCompressorState[groupNum - 1],true)">一键复位</a-button>
                    <a-button v-else size="small"  type="text" style="color: #fff;" @click="handlerDevice(airCompressorState[groupNum - 1],true)">一键复位</a-button>
                  </div>
                </div>
              </div>
            </template>
          </ventBox1>
          <ventBox1 class="vent-margin-t-10">
            <template #title>
              <div>设备实时监测曲线</div>
            </template>
            <template #container>
              <BarAndLineCustom
                xAxisPropType="readTime"
                :chartData="echartData"
                height="240px"
                :propTypeArr="['FluxTotal1', 'InputFlux']"
                :option="zhudanOption"
              />
            </template>
          </ventBox1>
        </div>
      </div>
    </div>
  </div>
  <HandleModal :modal-is-show="modalIsShow" :modal-title="modalTitle" :modal-type="modalType" @handle-ok="handleOK" @handle-cancel="handleCancel" />
</template>
<script lang="ts" setup name="nitrogenHome">
  import { onMounted, onUnmounted, ref, watch, reactive, defineProps, nextTick } from 'vue';
  import ventBox1 from '/@/components/vent/ventBox1.vue';
  import fourBorderBg from '../../../comment/components/fourBorderBg.vue';
  import { mountedThree, destroy, setModelType } from '../nitrogen.threejs';
  import { getDevice } from '../nitrogen.api';
  import { SvgIcon } from '/@/components/Icon';
  import BarAndLineCustom from '/@/components/chart/BarAndLineCustom.vue';
  import { zhudanOption } from '../nitrogen.data.ts';
  import HandleModal from './modal.vue';
  import { deviceControlApi } from '/@/api/vent/index';
  import { message } from 'ant-design-vue';

  const props = defineProps({
    deviceId: {
      type: String,
      require: true,
    },
    modalType: {
      type: String,
      require: true,
    },
  });
  const modalTitle = ref(''); // 模态框标题显示内容，根据设备操作类型决定
  const modalType = ref(''); // 模态框内容显示类型，设备操作类型
  const modalIsShow = ref<boolean>(false); // 是否显示模态框
  const loading = ref(true);
  let kzParam = reactive<any>({
    data: {},
    isFw:null,
  });
  // const kyjs = ['1号空压机', '1号空压机', '1号空压机', '1号空压机'];

  const flvURL1 = () => {
    // return `https://sf1-hscdn-tos.pstatp.com/obj/media-fe/xgplayer_doc_video/flv/xgplayer-demo-360p.flv`;
    return '';
  };

  const monitorDataGroupNum = ref(0);

  let airCompressorState = reactive<any[]>([]);

  const groupParameterData = [
    {
      FluxTotal1: '累计流量(m³)',
      InputFlux: '瞬时流量(m³/h)',
    },
    {
      PreMembraneTemperature: '膜前温度(­°C)',
      NitrogenPurity: '氮气纯度(%)',
    },
  ];
  const deviceParameterData = [
    {
      AirCompressor_ExhaustPre: '排气压力(KPa)',
      AirCompressor_ExhaustTemp: '排气温度(­°C)',
    },
    {
      AirCompressor_RunTime: '运行时间(h)',
      AirCompressor_LoadTime: '加载时间(h)',
    },
  ];

  const monitorData = ref(
    new Array(3).fill({
      // strName: '空压机',
      // cumulativeFlow: '-',
      // centerTemperature: '-',
      // outletTemperature: '-',
      // Ia: '-',
      // Ib: '-',
      // Ic: '-',
      // Vab: '-',
      // Vac: '-',
      // Vbc: '-',
      // compressGroupName: '',
      // compressExhaustPressF1: '-',
      // compressSeparatePressF1: '-',
      // compressHostTempF1: '-',
      // compressCrewTempF1: '-',
      // compressRunTimeF1: '-',
      // controlModel: 'LOC'
    })
  );

  //图表数据
  let echartData = reactive<any>([]);

  // https获取监测数据
  let timer: null | NodeJS.Timeout = null;
  async function getMonitor(flag?) {
    if (Object.prototype.toString.call(timer) === '[object Null]') {
      timer = await setTimeout(
        async () => {
          if (props.deviceId) {
            await getDataSource(props.deviceId);
          }
          if (timer) {
            timer = null;
          }
          await getMonitor();
        },
        flag ? 0 : 3000
      );
    }
  }

  async function getDataSource(systemID) {
    const res = await getDevice({ devicetype: 'sys', systemID, type: 'all' });
    console.log(res, 'res---------------');
   
    if (res) {
      const result = res;
      if (!result || result.msgTxt.length < 1) return;
      result.msgTxt.forEach((item) => {
        if (item.type && item.type.startsWith('nitrogen')) {
          monitorData.value = item['datalist'].filter((data) => {
            const item = data.readData;
            return Object.assign(data, item);
          });
          //图表数据
          if (echartData.length <= 5) {
            monitorData.value.forEach((el) => {
              echartData.push(el);
            });
          }

          airCompressorState.length = 0;
          item['datalist'].forEach((v) => {
            airCompressorState.push({
              id: v.deviceID,
              deviceType:v.deviceType,
              HMIReset:v.readData.HMIReset,
              HMIStartStop:v.readData.HMIStartStop
            });
          });
        }
      });
      monitorDataGroupNum.value = monitorData.value.length;
    }
  }

  function handlerDevice(data,bol) {
    console.log(bol,'bol-------')
    kzParam.data = data;
    kzParam.isFw = bol;
    console.log(kzParam,'kz--------')
    if ( bol) {
      modalTitle.value = '一键复位';
      modalType.value = '1';
      modalIsShow.value = true;
      kzParam.data.HMIReset=!data.HMIReset
    } else {
      modalTitle.value = '一键启停';
      modalType.value = '2';
      modalIsShow.value = true;
      kzParam.data.HMIStartStop =!data.HMIStartStop;
    }
  }
  function handleOK(passWord, handlerState) {
    console.log(kzParam, 'kz----------');
    // if (passWord !== '123456') {
    //   message.warning('密码不正确，请重新输入');
    //   return;
    // }

    let data = {};
    if (kzParam.isFw ) {
      data = {
        deviceid: kzParam.data.id,
        devicetype:kzParam.data.deviceType,
        password: passWord,
        HMIReset: kzParam.data.HMIReset,
      };
    } else {
      data = {
        deviceid: kzParam.data.id,
        password: passWord,
        devicetype:kzParam.data.deviceType,
        HMIStartStop: kzParam.data.HMIStartStop,
      };
    }

    deviceControlApi(data).then((res) => {
      // 模拟时开启
      if (res.success) {
        modalIsShow.value = false;
        getDataSource(props.deviceId);
        message.success('指令下发成功！')
      }
    });
  }
  function handleCancel() {
    modalIsShow.value = false;
    modalTitle.value = '';
    modalType.value = '';
  }

  watch([monitorDataGroupNum, loading], ([newMonitorDataGroupNum, newLoading]) => {
    nextTick(() => {
      if (newMonitorDataGroupNum && !newLoading) {
        setModelType(props.modalType, newMonitorDataGroupNum);
      }
    });
  });

  onMounted(async () => {
    await getMonitor(true);
    await mountedThree().then(() => {
      loading.value = false;
    });
  });

  onUnmounted(() => {
    destroy();
    if (timer) {
      clearTimeout(timer);
      timer = undefined;
    }
  });
</script>

<style lang="less" scoped>
  @ventSpace: zxm;

  .nitrogen-box {
    width: 100%;
    height: 100%;
    display: flex;
    justify-content: center;
  }

  #nitrogenCss3D {
    .modal-monitor {
      width: 200px;
      position: absolute;
      left: 0px;
      top: 0px;
    }

    &:deep(.win) {
      margin: 0 !important;
      background: #00000044;
    }
  }

  .nitrogen-home {
    width: 100%;
    height: 100%;
    position: fixed;
    z-index: 9999;
    display: flex;
    flex-direction: column;
    justify-content: center;
    align-items: center;
    pointer-events: none;
    top: 20px;

    .nitrogen-container {
      width: 100%;
      height: calc(100%);
      display: flex;
      justify-content: space-between;
      margin-bottom: 100px;

      .top-box {
        width: 100%;
        padding: 10px;
        overflow: hidden;
        display: flex;
        justify-content: space-between;

        .lr-box {
          height: fit-content;
          display: flex;
          flex-direction: column;
          position: relative;
          overflow: hidden;
          z-index: 9999;
          pointer-events: auto;
        }

        .item {
          width: 335px;
          height: auto;
          position: relative;
          border-radius: 5px;
          margin-top: 10px;
          margin-bottom: 0px;
          pointer-events: auto;
          color: #fff;
          overflow: hidden;

          &:first-child {
            margin-top: 0px;
          }

          .base-title {
            color: #fff;
            margin-bottom: 8px;
            padding-left: 10px;
            position: relative;
            font-size: 16px;

            &::after {
              content: '';
              position: absolute;
              display: block;
              width: 4px;
              height: 12px;
              top: 7px;
              left: 0px;
              background: #45d3fd;
              border-radius: 4px;
            }
          }

          .state-item {
            display: flex;
            flex-direction: row;
            padding: 5px;

            .item-col {
              width: calc(50% - 5px);
              display: flex;
              justify-content: center;
              align-items: center;
              padding-right: 4px;
              background-image: linear-gradient(to right, #39a3ff00, #39a3ff10);

              &:first-child {
                margin-right: 10px;
              }

              .state-title {
                color: #ffffffcc;
                flex: 9;
                font-size: 14px;
              }

              .state-val {
                flex: 1;
                color: #00eefffe;
                margin-right: 5px;
                text-align: right;
                font-size: 14px;
              }
            }
          }

          .signal-box {
            margin: 5px 0;
            display: flex;
            align-items: center;

            .signal-title {
              color: #7af5ff;
              margin: 0 5px;
            }

            &:last-child {
              margin-right: 0px;
            }
          }

          .list-item {
            padding: 0 10px;
            display: flex;
            justify-content: space-between;
            align-items: center;

            .item-data-key {
              color: #ffffff99;
            }
          }

          .item-data-box {
            color: #fff;

            .state-icon {
              display: inline-block;
              width: 12px;
              height: 12px;
              border-radius: 12px;
            }

            .open {
              border: 5px solid #133a56;
              background: #4ecb73;
            }

            .close {
              border: 5px solid #192961;
              background: #6d7898;
            }
          }
        }

        .item-l {
          width: 100%;

          .monitor-box {
            width: 100%;

            .parameter-title {
              position: relative;
              width: 100%;
              height: 14px;
              margin-top: 10px;

              .icon,
              span {
                position: absolute;
                top: -10px;
              }
            }

            .group-parameter-title {
              background-image: linear-gradient(to right, #39a3ff50, #39a3ff00);

              .icon {
                left: -12px;
                top: -17px;
              }

              span {
                left: 18px;
              }

              .item-col {
                background-image: linear-gradient(to right, #39a3ff00, #39a3ff10);
              }
            }

            .device-parameter-title {
              background-image: linear-gradient(to right, #3df6ff40, #3df6ff00);

              .icon {
                left: -10px;
                top: -14px;
              }

              span {
                left: 18px;
              }

              .item-col {
                background-image: linear-gradient(to right, #3df6ff10, #3df6ff00);
              }
            }
          }
        }

        .right-box {
          width: 330px;
          margin-top: 50px;

          .control-group {
            display: flex;
            // justify-content: space-around;
            flex-wrap: wrap;

            .control-item {
              width: 50%;//lxh
              display: flex;
              flex-direction: column;
              justify-content: center;
              align-items: center;
              padding: 0 4px;

              .control-item-title {
                color: #a6dce9;
                position: relative;
                top: 5px;
              }

              .control-item-state {
                width: 94px;
                height: 47px;
                background: url('/@/assets/images/vent/control-switch-bg.png');
                display: flex;
                justify-content: center;
                align-items: center;
                color: #fff;
              }

              .button-box {
                position: relative;
                padding: 5px;
                border: 1px transparent solid;
                background-clip: border-box;
                border-radius: 5px;
                margin-left: 8px;
              }

              .a-button {
                pointer-events: auto;
              }

              &::v-deep .a-button--mini {
                padding: 6px 10px;
              }

              &::v-deep .a-button--mini.is-round {
                padding: 6px 10px;
              }
            }
          }
        }

        .left-box {
          width: 365px;
          margin-top: 80px;
        }
      }

      &:deep(.win) {
        width: 100%;
        margin: 0 !important;
      }
    }
  }

  &:deep(.main) {
    .title {
      height: 34px;
      text-align: center;
      font-weight: 600;
      color: #7af5ff;
      // background-image: url('../../../assets/img/yfj/light.png');
      background-repeat: no-repeat;
      background-position-x: center;
      background-position-y: 100%;
      background-size: 80%;
      font-size: 16px;
    }

    .monitor-item {
      width: 200px;
      display: flex;
      flex-direction: row;
      width: auto;
      margin-bottom: 3px;

      .monitor-val {
        color: #ffb700;
        display: flex;
        width: auto;

        .val {
          width: 80px;
          font-size: 14px;
        }

        .unit {
          color: #ffffffbb;
          font-size: 14px;
        }
      }
    }

    .monitor-title {
      width: 100px;
      color: #7af5ff;
      font-weight: 400;
      font-size: 14px;
    }

    .signal-item {
      display: flex;
      justify-content: space-between;

      // margin-bottom: 5px;
      .signal-round {
        display: inline-block;
        width: 8px;
        height: 8px;
        border-radius: 50%;
        margin: 0 10px;
        position: relative;

        &::after {
          display: block;
          content: '';
          position: absolute;
          width: 12px;
          height: 12px;
          top: -2px;
          left: -2px;
          border-radius: 50%;
        }
      }

      .signal-round-gry {
        background-color: #858585;

        &::after {
          background-color: #85858544;
          box-shadow: 0 0 1px 1px #85858599;
        }
      }

      .signal-round-run {
        background-color: #67fc00;

        &::after {
          background-color: #67fc0044;
          box-shadow: 0 0 1px 1px #c6ff77;
        }
      }

      .signal-round-warning {
        background-color: #e9170b;

        &::after {
          background-color: #e9170b44;
          box-shadow: 0 0 1px 1px #e9170b;
        }
      }
    }
  }

  :deep(.zxm-radio-wrapper) {
    color: #fff !important;
  }
</style>
