<template>
  <div class="nitrogen-history">
    <HistoryTable columns-type="nitrogen" device-type="nitrogen" :sys-id="deviceId" designScope="nitrogen_auto_history" :scroll="{ y: 650 }" />
    <!-- <HistoryTable device-code="nitrogen" dict-code="nitrogen_dict" columns-code="nitrogen_auto_history" /> -->
  </div>
</template>
<script setup lang="ts">
  import HistoryTable from '../../comment/HistoryTable.vue';
  // import HistoryTable from '/@/views/vent/comment/history/HistoryTable.vue';
  const props = defineProps({
    deviceType: {
      type: String,
      required: true,
    },
    deviceId: {
      type: String,
      required: true,
    },
  });
</script>
<style lang="less" scoped>
  .nitrogen-history {
    position: fixed;
    top: 100px;
  }
</style>
