<template>
  <div class="sheet-bg">
    <div class="sheet-bg-inner">
      <table class="sheet-content">
        <colgroup>
          <col width="16" style="width: 9.75pt" />
          <col width="30" style="width: 18.45pt" />
          <col width="16" style="width: 9.75pt" span="10" />
          <col width="23" style="width: 14.05pt" />
          <col width="16" style="width: 9.75pt" span="5" />
          <col width="60" style="width: 36.3pt" />
          <col width="16" style="width: 9.75pt" span="2" />
          <col width="35" style="width: 21.35pt" span="2" />
          <col width="10" style="width: 6.05pt" />
          <col width="16" style="width: 9.75pt" />
          <col width="33" style="width: 20.2pt" />
          <col width="16" style="width: 9.75pt" span="4" />
          <col width="28" style="width: 17.3pt" />
          <col width="16" style="width: 9.75pt" span="3" />
          <col width="58" style="width: 35.15pt" />
          <col width="69" style="width: 41.5pt" />
          <col width="16" style="width: 9.75pt" span="7" />
          <col width="6" style="width: 3.7pt" />
          <col width="16" style="width: 9.75pt" span="2" />
          <col width="29" style="width: 17.9pt" />
          <col width="16" style="width: 9.75pt" span="4" />
        </colgroup>
        <tbody>
          <tr height="30">
            <td colspan="51" class="et22 bg0">主要通风机参数</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et21 bg1">地点</td>
            <td colspan="11" class="et21 bg1">型号</td>
            <td colspan="8" class="et21 bg1">电机功率（KW）</td>
            <td colspan="7" class="et21 bg1">最大风量</td>
            <td colspan="8" class="et21 bg1">实际风量</td>
            <td colspan="7" class="et21 bg1">负压（Pa）</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66">明安木独</td>
            <td colspan="11" class="et66">FBCDZ-10-NO.36</td>
            <td colspan="8" class="et66">2×800</td>
            <td colspan="7" class="et66">23400</td>
            <td colspan="8" class="et66">18857</td>
            <td colspan="7" class="et66">2280</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66">松定霍洛</td>
            <td colspan="11" class="et66">FBCDZ-10-NO.34</td>
            <td colspan="8" class="et66">2×560</td>
            <td colspan="7" class="et66">18000</td>
            <td colspan="8" class="et66">12867</td>
            <td colspan="7" class="et66">1500</td>
          </tr>
          <tr height="30">
            <td colspan="51" class="et22 bg2">通风系统</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66 bg1">进风井</td>
            <td colspan="6" class="et66 bg1">风量</td>
            <td colspan="10" class="et66 bg1">回风井</td>
            <td colspan="6" class="et66 bg1">风量</td>
            <td colspan="9" class="et21 bg1">综采面</td>
            <td colspan="10" class="et21 bg1">配风量</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et21">辅运平硐</td>
            <td colspan="6" class="et21">9542</td>
            <td colspan="7" rowspan="3" class="et21">明安木独 回风立井</td>
            <td colspan="3" rowspan="2" class>22煤</td>
            <td colspan="6" rowspan="2" class="et21">7695</td>
            <td colspan="9" class="et66">12201综采面</td>
            <td colspan="10" class="et66">1036</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et21">主斜井</td>
            <td colspan="6" class="et21">3939</td>
            <td colspan="9" class="et66">42204综放面</td>
            <td colspan="10" class="et66">1750</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et21">工业广场进风斜井</td>
            <td colspan="6" class="et21">339</td>
            <td colspan="3" class="et21">12煤</td>
            <td colspan="6" class="et21">11162</td>
            <td colspan="9" class="et66">12上302综放面</td>
            <td colspan="10" class="et66">1788</td>
          </tr>
          <tr height="30">
            <td colspan="7" rowspan="2" class="et21">松定霍洛 进风立井</td>
            <td colspan="3" class="et21">22煤</td>
            <td colspan="6" class="et21">7132</td>
            <td colspan="7" rowspan="2" class="et21">松定霍洛 回风立井</td>
            <td colspan="3" class="et21">22煤</td>
            <td colspan="6" class="et21">2098</td>
            <td colspan="19" rowspan="3" class="et21">等积孔14.2；＜1困难、1-2中等、＞2容易。</td>
          </tr>
          <tr height="30">
            <td colspan="3" class="et21">42煤</td>
            <td colspan="6" class="et21">9831</td>
            <td colspan="3" class="et21">42煤</td>
            <td colspan="6" class="et21">10769</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et21">总计</td>
            <td colspan="6" class="et21">30783</td>
            <td colspan="10" class="et66">总计</td>
            <td colspan="6" class="et66">31724</td>
          </tr>
          <tr height="30">
            <td colspan="51" class="et22 bg2">瓦斯参数</td>
          </tr>
          <tr height="30">
            <td colspan="17" class="et66 bg1">瓦斯等级鉴定</td>
            <td colspan="34" class="et66 bg1">瓦斯抽放</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66">绝对瓦斯涌出量</td>
            <td colspan="7" class="et66">29.92m³/min</td>
            <td colspan="14" class="et66">抽放泵站地点</td>
            <td colspan="8" class="et66">抽放工作面</td>
            <td colspan="12" class="et66">设备型号</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66">相对瓦斯涌出量</td>
            <td colspan="7" class="et66">0.83m³/t</td>
            <td colspan="14" class="et66">二水平中部辅运大巷1860米</td>
            <td colspan="8" class="et66">42205综放面</td>
            <td colspan="12" class="et66">ZWY270/355</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66">综采最大涌出量</td>
            <td colspan="7" class="et66">3.16m³/min</td>
            <td colspan="14" class="et66">12煤组辅运大巷480米</td>
            <td colspan="8" class="et66">12上302综放面</td>
            <td colspan="12" class="et66">ZWY300/355</td>
          </tr>
          <tr height="30">
            <td colspan="10" class="et66">掘进最大涌出量</td>
            <td colspan="7" class="et66">0.68m³/min</td>
            <td colspan="14" class="et66">12煤二盘区辅运大巷1280米</td>
            <td colspan="8" class="et66">12201综采面</td>
            <td colspan="12" class="et66">ZWY300/355</td>
          </tr>
          <tr height="28">
            <td colspan="51" rowspan="2" class="et12"
              >ZWY300/355：Z-泵站、W-瓦斯抽放、Y-移动式、270/300-流量（m³/min）、355-功率（KW），抽放混合量160～230m³/min，抽放瓦斯浓度0.5～1.2%，抽放瓦斯量0.8～3m³/min。</td
            >
          </tr>
          <tr height="28"> </tr>
          <tr height="30">
            <td colspan="51" class="et22 bg2">防灭火参数</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66 bg1">煤层</td>
            <td colspan="4" class="et66 bg1">倾向性</td>
            <td colspan="6" class="et66 bg1">最短发火期</td>
            <td colspan="4" class="et21 bg1">三带</td>
            <td colspan="6" class="et21 bg1">散热带m</td>
            <td colspan="6" class="et21 bg1">氧化带m</td>
            <td colspan="6" class="et21 bg1">窒息带m</td>
            <td colspan="15" class="et66 bg1">红外束管</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66">12上煤</td>
            <td colspan="4" rowspan="4" class="et21">I类易自燃</td>
            <td colspan="6" class="et66">53</td>
            <td colspan="4" rowspan="2" class="et21">12上煤</td>
            <td colspan="6" rowspan="2" class="et21">＜69</td>
            <td colspan="6" rowspan="2" class="et66">69-188</td>
            <td colspan="6" rowspan="2" class="et66">＞188</td>
            <td colspan="4" class="et66">型号</td>
            <td colspan="11" class="et21">可分析气体</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66">12煤</td>
            <td colspan="6" class="et66">37</td>
            <td colspan="4" rowspan="3" class="et66">JSG-8</td>
            <td colspan="4" class="et21">甲烷</td>
            <td colspan="7" class="et21">一氧化碳</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66">22煤</td>
            <td colspan="6" class="et66">36</td>
            <td colspan="4" class="et21">22煤</td>
            <td colspan="6" class="et21">＜45.9</td>
            <td colspan="6" class="et66">45.9-222.3</td>
            <td colspan="6" class="et66">＞222.3</td>
            <td colspan="4" class="et21">氧气</td>
            <td colspan="7" class="et21">二氧化碳</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66">42上煤</td>
            <td colspan="6" class="et66">34</td>
            <td colspan="4" class="et21">42上煤</td>
            <td colspan="6" class="et21">＜47.3</td>
            <td colspan="6" class="et66">47.3-188.0</td>
            <td colspan="6" class="et66">＞188.0</td>
            <td colspan="4" class="et21">乙烯</td>
            <td colspan="7" class="et21">乙炔</td>
          </tr>
          <tr height="30">
            <td colspan="16" class="et66 bg1">色谱分析仪</td>
            <td colspan="8" class="et66 bg1">注浆系统</td>
            <td colspan="12" class="et66 bg1">注氮系统</td>
            <td colspan="7" class="et66 bg1">地表回填</td>
            <td colspan="8" class="et66 bg1">采空区管理</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66">型号</td>
            <td colspan="12" class="et21">可分析气体</td>
            <td colspan="3" rowspan="2" class="et21">松定霍洛风井广场</td>
            <td colspan="3" rowspan="4" class="et21">能力 120m³/h</td>
            <td colspan="2" rowspan="4" class="et21">20.4万m³/年</td>
            <td colspan="8" class="et66">22209辅运1#联巷</td>
            <td colspan="3" class="et66">DM-1000</td>
            <td rowspan="4" class="et21">534 万m³/年</td>
            <td colspan="7" rowspan="3" class="et21">鄂尔多斯宇和劳务服务有限公司</td>
            <td colspan="4" class="et66">12煤</td>
            <td colspan="4" class="et66">0个</td>
          </tr>
          <tr height="38">
            <td colspan="4" rowspan="3" class="et66">SP-2010</td>
            <td colspan="3" class="et21">甲烷</td>
            <td colspan="7" class="et21">一氧化碳</td>
            <td colspan="2" rowspan="3" class="et21">乙 烷</td>
            <td colspan="8" class="et66">42205辅运1#联巷</td>
            <td colspan="3" class="et66">DM-1500</td>
            <td colspan="4" class="et66">12上煤</td>
            <td colspan="4" class="et66">1个</td>
          </tr>
          <tr height="30">
            <td colspan="3" class="et21">氧气</td>
            <td colspan="7" class="et21">二氧化碳</td>
            <td colspan="3" rowspan="2" class="et21">明安木独风井广场</td>
            <td colspan="8" class="et66">12302主运4联巷</td>
            <td colspan="3" class="et66">DM-1500</td>
            <td colspan="4" class="et66">22煤</td>
            <td colspan="4" class="et66">17个</td>
          </tr>
          <tr height="30">
            <td colspan="3" class="et21">乙烯</td>
            <td colspan="7" class="et21">乙炔</td>
            <td colspan="8" class="et66">12煤集中供液站</td>
            <td colspan="3" class="et66">DM-1500</td>
            <td colspan="7" class="et66">246万㎡</td>
            <td colspan="4" class="et66">42煤</td>
            <td colspan="4" class="et66">12个</td>
          </tr>
          <tr height="63">
            <td colspan="51" rowspan="2" class="et12"
              >1.JSG-8:J-监测、SG-束管、可分析8种气体。DM-1000、DM-1500：D-制氮装置、M-膜分离、1000m³/h、1500m³/h。
              2.井下现有束管监测分站3套，对3个回采面采空区和3个相邻的已采采空区共计12个监测点24小时监测。采空区瓦斯最大为22煤一盘区边界巷密闭内36.
              3.一般防火密闭设计:1米砼闭+1米黄土+0.5米砖闭+1.5米砼闭。
              4.永久防火密闭12道、一般防火密闭143道、临时密闭468道、行车风门103道、行人风门87道、风桥62道。</td
            >
          </tr>
          <tr height="63"> </tr>
          <tr height="30">
            <td colspan="51" class="et22 bg2">防尘参数</td>
          </tr>
          <tr height="30">
            <td colspan="3" rowspan="6" class="bg1">煤尘有爆炸性</td>
            <td colspan="15" class="et66">掘进除尘</td>
            <td colspan="33" class="et66">ZGJFH30、ZGJFH55煤矿井下自动隔爆装置</td>
          </tr>
          <tr height="30">
            <td colspan="4" class="et66">除尘箱</td>
            <td colspan="11" class="et66">KCG-350/500D</td>
            <td colspan="10" class="et66">安装位置</td>
            <td colspan="12" class="et66">工作原理</td>
            <td colspan="11" rowspan="5" class="et12">ZGJFH30：Z-装置、G-隔爆、J-机械式、F-粉剂、H-巷道、30-粉剂量30KG</td>
          </tr>
          <tr height="26">
            <td colspan="4" class="et66">风机</td>
            <td colspan="11" class="et66">2×30/37KW</td>
            <td colspan="10" rowspan="2" class="et21">盘区大巷、工作面顺槽</td>
            <td colspan="12" rowspan="4" class="et12">爆炸冲击波冲击触发装置，启动主体装置喷射干粉灭火剂扑灭火焰。</td>
          </tr>
          <tr height="26">
            <td colspan="15" rowspan="3" class="et12">KCG-500D：K-矿用、C-除尘、G-干式、500-处理风量、D-电动。</td>
          </tr>
          <tr height="26">
            <td colspan="10" rowspan="2" class="et21">采掘工作面60~200m内</td>
          </tr>
          <tr height="26"> </tr>
        </tbody>
      </table>
    </div>
  </div>
</template>
<script lang="ts" setup>
  // 转换工具 https://www.lingdaima.com/table/
</script>
<style lang="less" scoped>
  @import url('/@/design/theme.less');

  @{theme-deepblue} {
    .sheet-bg {
      --sheet-bg: url(/@/assets/images/themify/deepblue/sheet-bg.png);
      --sheet-header: url(/@/assets/images/themify/deepblue/sheet-header.png);
    }
  }

  .sheet-bg {
    --sheet-bg: url(/@/assets/images/vent/sheet-bg.png);
    --sheet-header: url(/@/assets/images/vent/sheet-header.png);
    width: 100%;
    height: 92%;
    background-image: var(--sheet-bg);
    background-size: 98% 98%;
    background-repeat: no-repeat;
    background-position: center;
    position: relative;
    padding: 50px 0;
  }
  .sheet-bg-inner {
    margin: 0 auto;
    height: 100%;
    overflow-y: auto;
  }
  .sheet-content {
    width: 1260px;
    border-spacing: 0;
    color: #fff;
    margin: 0 auto;
    text-align: center;
  }
  .bg0 {
    width: 100%;
    height: 73px;
    font-size: 20px;
    background-image: var(--sheet-header);
    background-size: 100% 73px;
    background-repeat: no-repeat;
    border: none;
  }
  .bg1 {
    background-image: @vent-configurable-dropdown;
    background-size: 100% 100%;
    background-repeat: no-repeat;
    color: @vent-table-action-link;
  }
  .bg2 {
    width: 100%;
    height: 93px;
    font-size: 20px;
    background-image: var(--sheet-header);
    background-size: 100% 73px;
    background-repeat: no-repeat;
    background-position: bottom;
    border: none;
    padding-top: 20px;
  }
  table td {
    border: 1px solid @vent-gas-tab-border;
    font-size: 13px;
    padding: 5px;
  }
</style>
