<template>
  <div class="nitrogen-history">
     <HistoryTable columns-type="pressurefan_history" device-type="pressurefan" :device-list-api="getTableList.bind(null, {devicekind :'pressurefan'})" designScope="pressurefan_history" />
  </div>
</template>
<script setup lang="ts">
  import HistoryTable from '../../comment/HistoryTable.vue';
  import { getTableList } from '../nitrogen.api'

</script>
<style lang="less" scoped>
  .nitrogen-history{
    position: fixed;
    top: 80px;
  }
</style>