<template>
  <div id="nitrogen3D" style="width: 100%; height: 100%; position: absolute; overflow: hidden"></div>
  <div
    id="nitrogenCss3D"
    class="threejs-Object-CSS"
    style="width: 100%; height: 100%; position: absolute; pointer-events: none; overflow: hidden; z-index: 2; top: 0px; left: 0px"
  >
    <a-spin :spinning="loading" />
    <div v-for="groupNum in monitorDataGroupNum" :key="groupNum" class="modal-monitor">
      <fourBorderBg :class="`kyj${groupNum}`" :id="`nitrogenMonitor${groupNum}`">
        <!-- <div class="title">空压机{{ groupNum }} </div> -->
        <div class="title">
          {{ monitorData && monitorData['strname' + groupNum] ? monitorData['strname' + groupNum] : '注氮机' + groupNum }}
          （
          <span :style="{ color: monitorData && monitorData['Status' + groupNum] == '1' ? '#67fc00' : '#e9170b' }">
            {{ monitorData && monitorData['Status' + groupNum] == '1' ? '运行' : '停止' }}
          </span>
          ）
        </div>
        <template v-for="(preMonitor, preMonitorIndex) in preMonitorList" :key="preMonitorIndex">
          <div v-if="preMonitor.code !== 'signal'" class="monitor-item">
            <span class="monitor-title">{{ preMonitor.title }}:</span>
            <span class="monitor-val"
              ><span class="val">{{ monitorData[preMonitor.code + groupNum] ? formatNum(monitorData[preMonitor.code + groupNum]) : '-' }}</span
              ><span class="unit">{{ preMonitor.unit }}</span></span
            >
          </div>
          <div v-else class="signal-item">
            <div class="signal" v-for="(signal, childIndex) in preMonitor.child" :key="childIndex">
              <span class="monitor-title">{{ signal.title }}</span>
              <span style="display: inline-block; width: 30px; text-align: center" v-if="signal.isFault == -2">{{
                monitorData[signal.code + groupNum] == '0' ? '就地' : monitorData[signal.code + groupNum] == '1' ? '远程' : '-'
              }}</span>
              <span style="display: inline-block; width: 30px; text-align: center" v-else-if="signal.isFault == -1">{{
                monitorData[signal.code + groupNum] == '1' ? '加载' : monitorData[signal.code + groupNum] == '0' ? '卸载' : '-'
              }}</span>
              <span
                v-else
                :class="{
                  'signal-round': true,
                  'signal-round-run': !signal.isFault && monitorData[signal.code + groupNum] == '1',
                  'signal-round-warning': signal.isFault && monitorData[signal.code + groupNum] == '1',
                  'signal-round-gry': monitorData[signal.code + groupNum] != '1',
                }"
              ></span>
            </div>
          </div>
        </template>
      </fourBorderBg>
    </div>
  </div>
  <div class="nitrogen-home">
    <div class="nitrogen-container">
      <div class="top-box">
        <!-- 中间区域控制按钮 -->
        <div class="center-item-box">
          <div class="top-left" v-if="airCompressorState.length > 0">
            <div class="button-box" @click="handlerDevice(airCompressorState[0], '主机启动')">上位机启动</div>
            <div class="button-box" @click="handlerDevice(airCompressorState[0], '主机停止')">上位机停止</div>
            <div class="button-box" @click="handlerDevice(airCompressorState[0], '备机启动')">上位复位</div>
          </div>
          <div class="top-center">
            <div class="top-c-label">通信状态：</div>
            <div class="top-c-val">{{ monitorData['netStatus'] == 1 ? '连接' : monitorData['netStatus'] == 0 ? '断开' : '未知' }}</div>
          </div>
          <div class="top-right">
            <div class="control-type" v-if="monitorData['RemSelect'] !== undefined">
              <div class="control-title">空压机远近控切换：</div>
              <a-radio-group v-model:value="monitorData['RemSelect']">
                <a-radio :value="`1`">远程</a-radio>
                <a-radio :value="`0`">就地</a-radio>
              </a-radio-group>
            </div>
            <div class="control-type" v-if="monitorData['LocSelect'] !== undefined">
              <div class="control-title">制氮机远近控切换：</div>
              <a-radio-group v-model:value="monitorData['LocSelect']">
                <a-radio :value="`1`">远程</a-radio>
                <a-radio :value="`0`">就地</a-radio>
              </a-radio-group>
            </div>
          </div>
        </div>
        <!-- 左边监测数据 -->
        <div class="lr-box left-box">
          <ventBox1 v-if="deviceType != 'nitrogen_52507'">
            <template #title>
              <div>注氮机监测</div>
            </template>
            <template #container>
              <div class="input-item" v-for="(preFan, index) in nitrogenMonitorData" :key="index">
                <div class="title">{{ preFan.title }}</div>
                <div v-if="preFan.unit !== 'signal' && preFan.unit !== 'warning'" class="value">{{
                  monitorData[preFan.code] >= 0 ? formatNum(Number(monitorData[preFan.code])) : '-'
                }}</div>
                <div
                  v-else
                  :class="{
                    'signal-round': true,
                    'signal-round-warning': monitorData[preFan.code] == '1' && preFan.unit == 'warning',
                    'signal-round-run': monitorData[preFan.code] == '1' && preFan.unit == 'signal',
                    'signal-round-gry': monitorData[preFan.code] != '1',
                  }"
                ></div>
                <div class="unit">{{ preFan.unit !== 'signal' && preFan.unit !== 'warning' ? `(${preFan.unit})` : '' }}</div>
              </div>
            </template>
          </ventBox1>
          <div class="item item-l" v-for="groupNum in monitorDataGroupNum" :key="groupNum">
            <ventBox1>
              <template #title>
                <div>{{ monitorData && monitorData['strname' + groupNum] ? monitorData['strname' + groupNum] : '注氮机' + groupNum }}</div>
              </template>
              <template #container>
                <div class="monitor-box">
                  <div class="monitor-item">
                    <div class="state-item" v-for="(preFan, index) in preFanMonitorData" :key="index">
                      <div class="state-title">{{
                        preFan.title + (preFan.unit !== 'signal' && preFan.unit !== 'warning' ? `(${preFan.unit})` : '')
                      }}</div>
                      <div v-if="preFan.unit !== 'signal' && preFan.unit !== 'warning'" class="value">{{
                        monitorData[preFan.code + groupNum] >= 0 ? formatNum(Number(monitorData[preFan.code + groupNum])) : '-'
                      }}</div>
                      <div
                        v-else
                        :class="{
                          'signal-round': true,
                          'signal-round-warning': monitorData[preFan.code + groupNum] == '1' && preFan.unit == 'warning',
                          'signal-round-run': monitorData[preFan.code + groupNum] == '1' && preFan.unit == 'signal',
                          'signal-round-gry': monitorData[preFan.code + groupNum] != '1',
                        }"
                      ></div>
                    </div>
                  </div>
                </div>
              </template>
            </ventBox1>
          </div>
        </div>
        <!-- 右边控制状态 -->
        <div class="lr-box right-box">
          <!-- <ventBox1 v-if="deviceType == 'nitrogen_52507'">
            <template #title>
              <div>注氮机监测</div>
            </template>
            <template #container>
              <div class="input-item" v-for="(preFan, index) in nitrogenMonitor" :key="index">
                <div class="title">{{ preFan.title }}</div>
                <div v-if="preFan.unit !== 'signal' && preFan.unit !== 'warning'" class="value">{{
                  monitorData[preFan.code] >= 0 ? formatNum(Number(monitorData[preFan.code])) : '-'
                }}</div>

                <div
                  v-else
                  :class="{
                    'signal-round': true,
                    'signal-round-warning': monitorData[preFan.code] == '1' && preFan.unit == 'warning',
                    'signal-round-run': monitorData[preFan.code] == '1' && preFan.unit == 'signal',
                    'signal-round-gry': monitorData[preFan.code] != '1',
                  }"
                ></div>
                <div class="unit">{{ preFan.unit !== 'signal' && preFan.unit !== 'warning' ? `(${preFan.unit})` : '' }}</div>
              </div>
            </template>
          </ventBox1> -->
          <ventBox1 class="vent-margin-t-10">
            <template #title>
              <div>设备实时监测曲线</div>
            </template>
            <template #container>
              <BarAndLine
                v-if="chartsColumns.length > 0"
                xAxisPropType="readTime"
                :dataSource="echartData"
                height="320px"
                :chartsColumns="chartsColumns"
                :option="echatsOption"
              />
            </template>
          </ventBox1>
        </div>
      </div>
      <div v-if="renderPlayer" ref="playerRef" class="player-box" style=""> </div>
    </div>
    <div class="modal-monitor">
      <fourBorderBg id="downWindMonitor">
        <div class="title">下风侧监测 </div>
        <div class="monitor-item" v-for="(data, index) in downWindData" :key="index">
          <span class="monitor-title">{{ data.title }} :</span>
          <span class="monitor-val" v-if="!refresh"
            ><span class="val">
              {{ monitorData && monitorData[data.code] ? (data.raw ? monitorData[data.code] : parseFloat(monitorData[data.code]).toFixed(2)) : '-' }}
            </span>
            <span class="unit">{{ data.unit }}</span></span
          >
        </div>
      </fourBorderBg>
    </div>
  </div>
</template>
<script lang="ts" setup name="nitrogenHome">
  import { onMounted, onUnmounted, ref, watch, reactive, defineProps, nextTick, inject, onBeforeUnmount } from 'vue';
  import ventBox1 from '/@/components/vent/ventBox1.vue';
  import fourBorderBg from '../../../comment/components/fourBorderBg.vue';
  import { mountedThree, destroy, setModelType } from '../nitrogen.threejs';
  import { getDevice } from '../nitrogen.api';
  import BarAndLine from '/@/components/chart/BarAndLine.vue';
  import { deviceControlApi } from '/@/api/vent/index';
  import { preFanMonitorData, preMonitorList, nitrogenMonitorData } from '../nitrogen.data.hlg';
  import { downWindData } from '../nitrogen.data';
  import { formatNum } from '/@/utils/ventutil';
  import { useCamera } from '/@/hooks/system/useCamera';
  import { message } from 'ant-design-vue';
  import lodash from 'lodash';
  import { getTableHeaderColumns } from '/@/hooks/web/useWebColumns';

  const globalConfig = inject('globalConfig');

  const props = defineProps({
    deviceId: {
      type: String,
      require: true,
    },
    modalType: {
      type: String,
      require: true,
    },
  });
  const renderPlayer = ref(true);
  const playerRef = ref();
  const refresh = ref(false);
  const modalTitle = ref(''); // 模态框标题显示内容，根据设备操作类型决定
  const modalType = ref(''); // 模态框内容显示类型，设备操作类型
  const modalIsShow = ref<boolean>(false); // 是否显示模态框
  const loading = ref(true);
  let kzParam = reactive<any>({
    data: {},
    isFw: null,
  });

  // const kyjs = ['1号空压机', '1号空压机', '1号空压机', '1号空压机'];
  const flvURL1 = () => {
    // return `https://sf1-hscdn-tos.pstatp.com/obj/media-fe/xgplayer_doc_video/flv/xgplayer-demo-360p.flv`;
    return '';
  };
  const colors = ['#FDB146', '#EE6666', '#9BCB75', '#03C2EC', '#DA3914', '#9C83D9'];
  const echatsOption = {
    grid: {
      top: '35%',
      left: '15%',
      right: '20px',
      bottom: '8%',
      // containLabel: true
    },
    toolbox: {
      feature: {},
    },
  };

  const deviceType = ref('');
  const monitorNetStatus = ref(0);
  const monitorDataGroupNum = ref(1);

  let airCompressorState = reactive<any[]>([]);

  // const chartsColumns = ref([
  //   {
  //     legend: '瞬时流量',
  //     seriesName: '(m³/h)',
  //     ymax: 2000,
  //     yname: 'm³/h',
  //     linetype: 'line',
  //     yaxispos: 'left',
  //     color: '#FDB146',
  //     sort: 1,
  //     xRotate: 0,
  //     dataIndex: 'InputFlux',
  //   },
  // ]);
  const chartsColumns = ref(getTableHeaderColumns('sys_nitrogen_chart'));

  const { getCamera, removeCamera } = useCamera();

  const monitorData = ref({});

  //图表数据
  let echartData = ref<any>([]);

  // https获取监测数据
  let timer: null | NodeJS.Timeout = null;
  async function getMonitor(flag?) {
    if (Object.prototype.toString.call(timer) === '[object Null]') {
      return new Promise(async (resolve) => {
        timer = await setTimeout(
          async () => {
            if (props.deviceId) {
              await getDataSource(props.deviceId);
            }
            if (timer) {
              timer = null;
            }
            resolve(null);
            await getMonitor();
          },
          flag ? 0 : 3000
        );
      });
    }
  }

  async function getDataSource(systemID) {
    const res = await getDevice({ devicetype: 'sys', systemID, type: 'all' });
    if (res) {
      const result = res;

      // const result = {
      //   cmd: 'monitordata',
      //   msgTxt: [
      //     {
      //       datalist: [
      //         {
      //           msgType: null,
      //           deviceID: '1818548876779245569',
      //           strname: '52507注氮机-2',
      //           strinstallpos: '52507注氮机-2',
      //           fsectarea: 'null',
      //           stationname: '52507注氮机-2',
      //           stationtype: 'redis',
      //           deviceType: 'nitrogen_525072',
      //           typeName: '52507注氮机2',
      //           netStatus: 1,
      //           warnFlag: 0,
      //           warnLevel: 0,
      //           warnLevel_str: '正常',
      //           syswarnLevel: null,
      //           syswarnLevel_str: null,
      //           syswarnLevel_des: null,
      //           warnTime: null,
      //           readTime: '2024-08-04 17:59:25',
      //           warnDes: '',
      //           frontGateOpenCtrl: null,
      //           rearGateOpenCtrl: null,
      //           readData: {
      //             FluxTotal12: '0.0',
      //             RunTime42: '131072000',
      //             NitrogenPurity2: '26',
      //             ExhaustTemp2: '25.0',
      //             Status2: '0',
      //             RunTime2: '0',
      //             sign: '0',
      //             OilGasBarrel_SeparatorFault2: '0',
      //             TotalFailureSignal2: '0',
      //             InputFlux2: '5',
      //             PhaseFailureFault12: '0',
      //             RunTime22: '3080192',
      //             LowVoltageFault2: '0',
      //             SysVoltage2: '1158',
      //             Fan_Current2: '0',
      //             CtrlMode2: '1',
      //             ExhaustPreHighFault2: '0',
      //             ShortCutFaul2: '0',
      //             OilGasBarrel_OverTempAlarm2: '0',
      //             CloseFail2: '0',
      //             OilGasBarrel_FilterBlockageFault2: '0',
      //             HMIStartStop2: '0',
      //             OilGasBarrel_OverTempAlarm12: '0',
      //             OverVoltageFault2: '0',
      //             OilGasBarrel_HighPressureFault2: '0',
      //             Fan_OverloadFault2: '0',
      //             OilPressureLowFault2: '0',
      //             PhaseSequenceFault2: '0',
      //             PhaseFailureFault2: '0',
      //             RunTime32: '35323904',
      //             MainMotor_OverTempFault2: '0',
      //             FluxTotal22: '0.0',
      //             PowerFault2: '0',
      //             LoadorUnload2: '0',
      //             PreMembraneTemperature2: '-19',
      //             PhaseSequenceFault12: '0',
      //             RunTime12: '393216',
      //             ExhaustTemp12: '0',
      //             TotalFailureSignal12: '0',
      //             UnbalanceFault2: '0',
      //             ExhaustPre2: '0',
      //             MainMotor_OverloadFault2: '0',
      //             NoWaterFault2: '0',
      //             LoadTime2: '539',
      //             MainMotor_Current2: '0',
      //             isRun: '-2',
      //             LeakageLock2: '0',
      //             OpenFail2: '0',
      //           },
      //           readDataDes: null,
      //           summaryHour: [],
      //           summaryDay: [],
      //           history: [],
      //           dayhistory: [],
      //           totalInfo: null,
      //           sign: null,
      //           cameras: [],
      //           links: [],
      //           other1: null,
      //           other2: null,
      //           other3: null,
      //           remarkInfo: null,
      //           linkInfo: null,
      //           addrIndex: null,
      //           warnLogNotOkCount: 0,
      //         },
      //       ],
      //       avginfo: {
      //         warnFlag: {
      //           value: 0,
      //         },
      //       },
      //       typeName: '52507注氮机2',
      //       type: 'nitrogen_525072',
      //     },
      //     {
      //       datalist: [
      //         {
      //           msgType: null,
      //           deviceID: '1818546650996330498',
      //           strname: '52507注氮机-1',
      //           strinstallpos: '52507注氮机-1',
      //           fsectarea: 'null',
      //           stationname: '52507注氮机-1',
      //           stationtype: 'redis',
      //           deviceType: 'nitrogen_525071',
      //           typeName: '52507注氮机1',
      //           netStatus: 1,
      //           warnFlag: 0,
      //           warnLevel: 0,
      //           warnLevel_str: '正常',
      //           syswarnLevel: null,
      //           syswarnLevel_str: null,
      //           syswarnLevel_des: null,
      //           warnTime: null,
      //           readTime: '2024-08-04 17:59:25',
      //           warnDes: '',
      //           frontGateOpenCtrl: null,
      //           rearGateOpenCtrl: null,
      //           readData: {
      //             RunTime41: '131072000',
      //             NitrogenPurity1: '12',
      //             ExhaustTemp1: '82.0',
      //             RunTime21: '786432',
      //             RunTime1: '1',
      //             sign: '0',
      //             OilGasBarrel_SeparatorFault1: '0',
      //             InputFlux1: '13',
      //             PhaseFailureFault11: '0',
      //             LowVoltageFault1: '0',
      //             SysVoltage1: '1149',
      //             TotalFailureSignal1: '0',
      //             Fan_Current1: '0',
      //             ExhaustPreHighFault1: '0',
      //             ShortCutFaul1: '0',
      //             OilGasBarrel_OverTempAlarm1: '0',
      //             CloseFail1: '0',
      //             OilGasBarrel_FilterBlockageFault1: '0',
      //             OilGasBarrel_OverTempAlarm11: '0',
      //             HMIStartStop1: '0',
      //             CtrlMode1: '1',
      //             Fan_OverloadFault1: '0',
      //             OilPressureLowFault1: '0',
      //             OverVoltageFault1: '0',
      //             OilGasBarrel_HighPressureFault1: '0',
      //             PhaseFailureFault1: '0',
      //             RunTime31: '70516736',
      //             FluxTotal21: '0.0',
      //             FluxTotal1: '0.01',
      //             MainMotor_OverTempFault1: '0',
      //             PhaseSequenceFault1: '0',
      //             PowerFault1: '0',
      //             LoadorUnload1: '0',
      //             RunTime11: '3342336',
      //             PhaseSequenceFault11: '0',
      //             PreMembraneTemperature1: '25',
      //             TotalFailureSignal11: '0',
      //             UnbalanceFault1: '0',
      //             ExhaustTemp11: '0',
      //             ExhaustPre1: '89',
      //             MainMotor_OverloadFault1: '0',
      //             NoWaterFault1: '0',
      //             Status1: '0',
      //             LoadTime1: '1086',
      //             isRun: '-2',
      //             LeakageLock1: '0',
      //             MainMotor_Current1: '95',
      //             OpenFail1: '0',
      //             o2Val: '20.23',
      //             temperature: '19.5',
      //             fumes_str: '0.2',
      //           },
      //           readDataDes: null,
      //           summaryHour: [],
      //           summaryDay: [],
      //           history: [],
      //           dayhistory: [],
      //           totalInfo: null,
      //           sign: null,
      //           cameras: [],
      //           links: [],
      //           other1: null,
      //           other2: null,
      //           other3: null,
      //           remarkInfo: null,
      //           linkInfo: null,
      //           addrIndex: null,
      //           warnLogNotOkCount: 0,
      //         },
      //       ],
      //       avginfo: {
      //         warnFlag: {
      //           value: 0,
      //         },
      //       },
      //       typeName: '52507注氮机1',
      //       type: 'nitrogen_525071',
      //     },
      //     {
      //       subtype: 'sys_nitrogen',
      //       datalist: [
      //         {
      //           msgType: '2',
      //           deviceID: '1818821502634352642',
      //           strname: '52507注氮系统',
      //           strinstallpos: '52507注氮系统',
      //           fsectarea: 'null',
      //           stationname: null,
      //           stationtype: null,
      //           deviceType: 'sys_nitrogen',
      //           typeName: '注氮系统',
      //           netStatus: null,
      //           warnFlag: 0,
      //           warnLevel: null,
      //           warnLevel_str: null,
      //           syswarnLevel: 0,
      //           syswarnLevel_str: null,
      //           syswarnLevel_des: null,
      //           warnTime: null,
      //           readTime: '2024-08-01 09:56:28',
      //           warnDes: '',
      //           frontGateOpenCtrl: null,
      //           rearGateOpenCtrl: null,
      //           readData: {
      //             sign: '0',
      //             isRun: '-2',
      //           },
      //           readDataDes: null,
      //           summaryHour: [],
      //           summaryDay: [],
      //           history: null,
      //           dayhistory: [],
      //           totalInfo: null,
      //           sign: null,
      //           cameras: [],
      //           links: [],
      //           other1: null,
      //           other2: null,
      //           other3: null,
      //           remarkInfo: null,
      //           linkInfo: null,
      //           addrIndex: null,
      //           warnLogNotOkCount: 0,
      //         },
      //       ],
      //       typeName: '综合监测系统',
      //       type: 'sys',
      //     },
      //   ],
      // };

      if (!result || result.msgTxt.length < 1) return;
      let dataSoreDatas = {};
      let netStatus = 0;
      result.msgTxt.forEach((item, index) => {
        if (item.type && item.type.startsWith('nitrogen')) {
          airCompressorState.length = 0;

          if (item.type.startsWith('nitrogen_52507')) {
            if (deviceType.value !== 'nitrogen_52507') deviceType.value = 'nitrogen_52507';
            dataSoreDatas = Object.assign(dataSoreDatas, item['datalist'][0], item['datalist'][0]['readData']);
            dataSoreDatas['strname' + (index + 1)] = item['datalist'][0]['strname'];
            if (item['datalist'][0]['netStatus']) {
              netStatus = 1;
            }
          } else {
            deviceType.value = '';
            monitorData.value = Object.assign(item['datalist'][0], item['datalist'][0]['readData']);
            if (monitorData.value['netStatus'] == 1) {
              netStatus = 1;
            }
            airCompressorState.push({
              id: monitorData.value['deviceID'],
              deviceType: monitorData.value['deviceType'],
              HMIStart: monitorData.value['HMIStart'],
              HMIStop: monitorData.value['HMIStop'],
            });
          }
        }
      });
      if (JSON.stringify(dataSoreDatas) !== '{}') {
        monitorData.value = dataSoreDatas;
      }
      monitorNetStatus.value = netStatus;
      const dataArr = lodash.cloneDeep(echartData.value);

      const airCompressor = { readTime: monitorData.value['readTime'].substring(11) };
      if (JSON.stringify(dataSoreDatas) === '{}') {
        airCompressor[`FluxTotal`] = monitorData.value['FluxTotal'] || 0;
      }
      // airCompressor[`InputFlux`] = Number(monitorData.value['InputFlux1']) + Number(monitorData.value['InputFlux2']) || null;
      // if (!airCompressor[`InputFlux`]) {
      //   airCompressor[`InputFlux`] = monitorData.value['InputFlux'];
      // }
      airCompressor[`InputFlux`] =
        monitorData.value['InputFlux'] || Number(monitorData.value['InputFlux1']) + Number(monitorData.value['InputFlux2']);

      monitorData.value['FluxTotal'] = airCompressor[`InputFlux`];
      //图表数据
      if (dataArr.length <= 5) {
        dataArr.push(airCompressor);
      } else {
        dataArr.shift();
        dataArr.push(airCompressor);
      }
      echartData.value = dataArr;
      refresh.value = true;
      nextTick(() => {
        refresh.value = false;
      });
    }
  }

  function handlerDevice(data, bol) {
    kzParam.data = data;
    kzParam.isFw = bol;
    if (bol) {
      modalTitle.value = '一键复位';
      modalType.value = '1';
      modalIsShow.value = true;
      kzParam.data.HMIReset = !data.HMIReset;
    } else {
      modalTitle.value = '一键启停';
      modalType.value = '2';
      modalIsShow.value = true;
      kzParam.data.HMIStartStop = !data.HMIStartStop;
    }
  }
  function handleOK(passWord, handlerState) {
    console.log(kzParam, 'kz----------');
    // if (passWord !== '123456') {
    //   message.warning('密码不正确，请重新输入');
    //   return;
    // }

    let data = {};
    if (kzParam.isFw) {
      data = {
        deviceid: kzParam.data.id,
        devicetype: kzParam.data.deviceType,
        password: passWord,
        HMIReset: kzParam.data.HMIReset,
      };
    } else {
      data = {
        deviceid: kzParam.data.id,
        password: passWord,
        devicetype: kzParam.data.deviceType,
        HMIStartStop: kzParam.data.HMIStartStop,
      };
    }

    deviceControlApi(data).then((res) => {
      // 模拟时开启
      if (res.success) {
        modalIsShow.value = false;
        getDataSource(props.deviceId);
        if (globalConfig.History_Type == 'remote') {
          message.success('指令已下发至生产管控平台成功！');
        } else {
          message.success('指令已下发成功！');
        }
      }
    });
  }
  function handleCancel() {
    modalIsShow.value = false;
    modalTitle.value = '';
    modalType.value = '';
  }

  watch([monitorDataGroupNum, loading], ([newMonitorDataGroupNum, newLoading]) => {
    nextTick(() => {
      if (newMonitorDataGroupNum && !newLoading) {
        setModelType(props.modalType, newMonitorDataGroupNum);
      }
    });
  });

  onMounted(async () => {
    await getMonitor(true);
    await mountedThree().then(() => {
      loading.value = false;
    });
    await getCamera(props.deviceId, playerRef, renderPlayer);
  });
  onBeforeUnmount(() => {
    removeCamera(playerRef);
  });
  onUnmounted(() => {
    destroy();
    if (timer) {
      clearTimeout(timer);
      timer = undefined;
    }
  });
</script>

<style lang="less" scoped>
  @import '/@/design/theme.less';
  @ventSpace: zxm;

  .nitrogen-box {
    width: 100%;
    height: 100%;
    display: flex;
    justify-content: center;
  }

  #nitrogenCss3D {
    .modal-monitor {
      width: 200px;
      position: absolute;
      left: 0px;
      top: 0px;
    }

    &:deep(.win) {
      margin: 0 !important;
      background: #00000044;
    }
  }

  .nitrogen-home {
    width: 100%;
    height: 100%;
    position: fixed;
    z-index: 9999;
    display: flex;
    flex-direction: column;
    justify-content: center;
    align-items: center;
    pointer-events: none;
    top: 20px;

    .nitrogen-container {
      width: 100%;
      height: calc(100% - 100px);
      display: flex;
      justify-content: space-between;
      margin-bottom: 100px;
      position: relative;
      .device-state {
        width: 100%;
        position: absolute;
        top: 20px;
        color: #e90000;
        display: flex;
        justify-content: center;
        font-size: 20px;
      }
      .top-box {
        width: 100%;
        padding: 10px;
        overflow: hidden;
        display: flex;
        justify-content: space-between;
        // margin-top: 40px;

        .center-item-box {
          position: absolute;
          left: 50%;
          top: 50px;
          transform: translate(-48%, 0);
          width: calc(100% - 720px);
          height: 50px;
          display: flex;
          align-items: center;
          pointer-events: auto;

          .top-left {
            display: flex;
            flex: 1.5;
            color: #fff;

            .button-box {
              position: relative;
              width: auto;
              height: 32px;
              display: flex;
              align-items: center;
              justify-content: center;
              border-radius: 5px;
              color: #fff;
              padding: 10px 15px;
              margin: 0px 10px;
              box-sizing: border-box;
              cursor: pointer;
              background: linear-gradient(#1fa6cb, #127cb5);
              &:hover {
                background: linear-gradient(#1fa6cbcc, #127cb5cc);
              }
            }
          }
          .top-center {
            display: flex;
            flex: 1;
            justify-content: center;
            align-items: center;
            font-size: 20px;
            color: #fff;
            .top-c-label {
              color: yellow;
            }
          }

          .top-right {
            display: flex;
            flex: 2;
            justify-content: right;
            align-items: center;
            color: #fff;
            .control-type {
              display: flex;
              color: #fff;
              .control-title {
                color: #73e8fe;
              }
            }
          }
        }
        .lr-box {
          height: 100%;
          display: flex;
          flex-direction: column;
          position: relative;
          // overflow: hidden;
          z-index: 9999;
          pointer-events: auto;
          overflow-y: auto;
          overflow-x: hidden;
          .input-item {
            display: flex;
            justify-content: space-between;
            align-items: center;
            padding: 4px 8px;
            margin: 6px 0;
            background-image: linear-gradient(to right, #39deff15, #3977e500);

            .title {
              width: 200px;
            }
            .title-auto {
              width: auto;
            }

            .input-value {
              width: 80px;
              height: 28px;
              line-height: 28px !important;
              background: transparent !important;
              border-color: #228da2 !important;
              color: #fff !important;
            }
            .value {
              width: 100px;
              color: #00d8ff;
              padding-right: 20px;
            }
            .unit {
              width: 80px;
              text-align: right;
            }
          }
        }

        .item {
          width: 305px;
          height: auto;
          position: relative;
          border-radius: 5px;
          margin-top: 10px;
          margin-bottom: 0px;
          pointer-events: auto;
          color: #fff;
          // overflow: hidden;

          &:first-child {
            margin-top: 0px;
          }

          .base-title {
            color: #fff;
            margin-bottom: 8px;
            padding-left: 10px;
            position: relative;
            font-size: 16px;

            &::after {
              content: '';
              position: absolute;
              display: block;
              width: 4px;
              height: 12px;
              top: 7px;
              left: 0px;
              background: #45d3fd;
              border-radius: 4px;
            }
          }

          .monitor-item {
            width: 100%;
            display: flex;
            flex-direction: row;
            flex-wrap: wrap;
            .state-item {
              width: 50%;
              padding: 5px;
              display: flex;
              align-items: center;
              justify-content: space-between;
              .state-title {
                width: 100px;
                color: #ffffffdd;
                flex: 9;
                font-size: 14px;
                .unit {
                  // color: #ffffffbb;
                }
                .value {
                  color: #00d8ff;
                }
              }
              .state-val {
                flex: 1;
                color: #e4a300;
                margin-right: 5px;
                text-align: right;
                font-size: 14px;
              }
            }
          }

          .signal-box {
            margin: 5px 0;
            display: flex;
            align-items: center;

            .signal-title {
              color: #7af5ff;
              margin: 0 5px;
            }

            &:last-child {
              margin-right: 0px;
            }
          }

          .list-item {
            padding: 0 10px;
            display: flex;
            justify-content: space-between;
            align-items: center;

            .item-data-key {
              color: #ffffff99;
            }
          }

          .item-data-box {
            color: #fff;

            .state-icon {
              display: inline-block;
              width: 12px;
              height: 12px;
              border-radius: 12px;
            }

            .open {
              border: 5px solid #133a56;
              background: #4ecb73;
            }

            .close {
              border: 5px solid #192961;
              background: #6d7898;
            }
          }
        }

        .item-l {
          width: 100%;

          .monitor-box {
            width: 100%;

            .parameter-title {
              position: relative;
              width: 100%;
              height: 14px;
              margin-top: 10px;

              .icon,
              span {
                position: absolute;
                top: -10px;
              }
            }

            .group-parameter-title {
              background-image: linear-gradient(to right, #39a3ff50, #39a3ff00);

              .icon {
                left: -12px;
                top: -17px;
              }

              span {
                left: 18px;
              }

              .item-col {
                background-image: linear-gradient(to right, #39a3ff00, #39a3ff10);
              }
            }

            .device-parameter-title {
              background-image: linear-gradient(to right, #3df6ff40, #3df6ff00);

              .icon {
                left: -10px;
                top: -14px;
              }

              span {
                left: 18px;
              }

              .item-col {
                background-image: linear-gradient(to right, #3df6ff10, #3df6ff00);
              }
            }
            .monitor-item {
              .value {
                color: #00d8ff;
              }
            }
          }
        }

        .right-box {
          width: 300px;
          margin-top: 50px;
        }

        .left-box {
          width: 335px;
          margin-top: 80px;
        }
      }
      &:deep(.win) {
        width: 100%;
        margin: 0 !important;
      }
    }
    .player-box {
      position: absolute;
      height: auto;
      // width: 100%;
      right: 0px;
      bottom: 110px;
      z-index: 99999;
      display: flex;
      #LivePlayerBox {
        width: auto !important;
      }
    }
  }

  &:deep(.main) {
    .title {
      height: 34px;
      text-align: center;
      font-weight: 600;
      color: #7af5ff;
      // background-image: url('../../../assets/img/yfj/light.png');
      background-repeat: no-repeat;
      background-position-x: center;
      background-position-y: 100%;
      background-size: 80%;
      font-size: 16px;
    }

    .monitor-item {
      width: 200px;
      display: flex;
      flex-direction: row;
      width: auto;
      margin-bottom: 3px;

      .monitor-val {
        color: #ffb700;
        display: flex;
        width: auto;

        .val {
          width: 80px;
          font-size: 14px;
        }

        .unit {
          color: #ffffffbb;
          font-size: 14px;
        }
      }
    }

    .monitor-title {
      width: 100px;
      color: #7af5ff;
      font-weight: 400;
      font-size: 14px;
    }

    .signal-item {
      display: flex;
      justify-content: space-between;

      // margin-bottom: 5px;
      .signal-round {
        display: inline-block;
        width: 8px;
        height: 8px;
        border-radius: 50%;
        margin: 0 10px;
        position: relative;

        &::after {
          display: block;
          content: '';
          position: absolute;
          width: 12px;
          height: 12px;
          top: -2px;
          left: -2px;
          border-radius: 50%;
        }
      }

      .signal-round-gry {
        background-color: #858585;

        &::after {
          background-color: #85858544;
          box-shadow: 0 0 1px 1px #85858599;
        }
      }

      .signal-round-run {
        background-color: #67fc00;

        &::after {
          background-color: #67fc0044;
          box-shadow: 0 0 1px 1px #c6ff77;
        }
      }

      .signal-round-warning {
        background-color: #e9170b;

        &::after {
          background-color: #e9170b44;
          box-shadow: 0 0 1px 1px #e9170b;
        }
      }
    }
  }

  :deep(.zxm-radio-wrapper) {
    color: #fff !important;
  }
</style>
