<template>
  <div>{{ Math.random() }}</div>
  <div id="nitrogen3D" style="width: 100%; height: 100%; position: absolute; overflow: hidden"></div>
  <div
    id="nitrogenCss3D"
    class="threejs-Object-CSS"
    style="width: 100%; height: 100%; position: absolute; pointer-events: none; overflow: hidden; z-index: 2; top: 0px; left: 0px"
  >
    <a-spin :spinning="loading" />
    <div v-for="groupNum in monitorDataGroupNum" :key="groupNum" class="modal-monitor">
      <fourBorderBg :class="`kyj${groupNum}`" :id="`nitrogenMonitor${groupNum}`">
        <div class="title">
          {{ monitorData[groupNum - 1]['strname'] }}
          <span :style="{ color: monitorData[groupNum - 1]['AirCompressor_Status'] == '1' ? '#67fc00' : '#e9170b' }">
            {{ monitorData[groupNum - 1]['AirCompressor_Status'] == '1' ? '(运行)' : '(停止)' }}
          </span>
        </div>
        <template v-for="(preMonitor, preMonitorIndex) in preMonitorList" :key="preMonitorIndex">
          <div v-if="preMonitor.code !== 'signal'" class="monitor-item">
            <span class="monitor-title">{{ preMonitor.title }}:</span>
            <span class="monitor-val"
              ><span class="val">{{ monitorData[groupNum - 1][preMonitor.code] ? formatNum(monitorData[groupNum - 1][preMonitor.code]) : '-' }}</span
              ><span class="unit">{{ preMonitor.unit }}</span></span
            >
          </div>
          <div v-else class="signal-item">
            <div class="signal" v-for="(signal, childIndex) in preMonitor.child" :key="childIndex">
              <span class="monitor-title">{{ signal.title }}</span>
              <span
                v-if="signal.isFault !== -1"
                :class="{
                  'signal-round': true,
                  'signal-round-run': !signal.isFault && monitorData[groupNum - 1][preMonitor.code] == '1',
                  'signal-round-warning': signal.isFault && monitorData[groupNum - 1][preMonitor.code] == '1',
                  'signal-round-gry': monitorData[groupNum - 1][preMonitor.code] != '1',
                }"
              ></span>
              <span style="display: inline-block; width: 30px; text-align: center" v-else>{{
                monitorData[groupNum - 1][preMonitor.code] == '1' ? '加载' : monitorData[groupNum - 1][preMonitor.code] == '2' ? '卸载' : '-'
              }}</span>
            </div>
          </div>
        </template>
      </fourBorderBg>
    </div>
  </div>
  <div class="nitrogen-home">
    <div class="nitrogen-container">
      <div v-if="monitorNetStatus == 0" class="device-state">网络断开</div>
      <div class="top-box">
        <!-- 底部区域故障数据 -->
        <div class="footer-item-box">
          <div class="device-detail">
            <div class="device-title">&nbsp</div>
            <div v-for="groupNum in monitorDataGroupNum" :key="groupNum" class="device-title">
              {{ monitorData[groupNum - 1]['strname'] }}
            </div>
            <!-- <div class="device-val">故障</div> -->
          </div>
          <div v-for="(device, key) in deviceFault" class="device-detail" :key="key">
            <div class="device-title">{{ device.title }}</div>
            <div v-for="groupNum in monitorDataGroupNum" :key="groupNum" class="device-val">
              <span :style="{ color: monitorData[groupNum - 1][device.code] != '1' ? '#BFBFBF' : '#10BC79' }">{{
                monitorData[groupNum - 1][device.code] == '0' ? '正常' : monitorData[groupNum - 1][device.code] == '1' ? '故障' : '-'
              }}</span>
            </div>
          </div>
        </div>
        <!-- 左边监测数据 -->
        <div class="lr-box left-box">
          <div class="item item-l" v-for="groupNum in monitorDataGroupNum" :key="groupNum">
            <ventBox1>
              <template #title>
                <div>{{ monitorData[groupNum - 1]['strname'] }}</div>
              </template>
              <template #container>
                <div class="monitor-box">
                  <!-- <div class="parameter-title group-parameter-title">
                    <SvgIcon class="icon" size="38" name="device-group-paramer" /><span>机组参数</span>
                  </div> -->
                  <div class="monitor-item">
                    <div class="state-item" v-for="(preFan, index) in preFanMonitorData" :key="index">
                      <div class="state-title">{{ preFan.title + (preFan.unit !== 'signal' ? `(${preFan.unit})` : '') }}</div>
                      <div v-if="preFan.unit !== 'signal'" class="state-val">{{
                        monitorData[groupNum - 1][preFan.code] >= 0 ? formatNum(Number(monitorData[groupNum - 1][preFan.code])) : '-'
                      }}</div>
                      <div
                        v-else
                        :class="{
                          'signal-round': true,
                          'signal-round-warning': monitorData[groupNum - 1][preFan.code] == '1',
                          'signal-round-gry': monitorData[groupNum - 1][preFan.code] != '1',
                        }"
                      ></div>
                    </div>
                  </div>
                </div>
              </template>
            </ventBox1>
          </div>
        </div>
        <!-- 右边控制状态 -->
        <div class="lr-box right-box">
          <ventBox1 class="vent-margin-t-10">
            <template #title>
              <div>设备实时监测曲线</div>
            </template>
            <template #container>
              <BarAndLine
                v-if="chartsColumns.length > 0"
                xAxisPropType="readTime"
                :dataSource="echartData"
                height="340px"
                :chartsColumns="chartsColumns"
                :option="echatsOption"
              />
              <!-- :option="zhudanOption" -->
            </template>
          </ventBox1>
        </div>
      </div>
    </div>
    <div v-if="renderPlayer" ref="playerRef" class="player-box"></div>
  </div>
  <HandleModal :modal-is-show="modalIsShow" :modal-title="modalTitle" :modal-type="modalType" @handle-ok="handleOK" @handle-cancel="handleCancel" />
</template>
<script lang="ts" setup name="nitrogenHome">
  import { onMounted, onUnmounted, ref, watch, reactive, defineProps, nextTick, inject, computed } from 'vue';
  import ventBox1 from '/@/components/vent/ventBox1.vue';
  import fourBorderBg from '../../../comment/components/fourBorderBg.vue';
  import { mountedThree, destroy, setModelType, addText } from '../nitrogen.threejs';
  import { getDevice } from '../nitrogen.api';
  import { SvgIcon } from '/@/components/Icon';
  import BarAndLine from '/@/components/chart/BarAndLine.vue';
  import HandleModal from './modal.vue';
  import { deviceControlApi } from '/@/api/vent/index';
  import { preMonitorList, preFanMonitorData, deviceFault } from '../nitrogen.data.blt';
  import { message } from 'ant-design-vue';
  import lodash from 'lodash';
  import { formatNum } from '/@/utils/ventutil';
  import { getTableHeaderColumns } from '/@/hooks/web/useWebColumns';
  import { useCamera } from '/@/hooks/system/useCamera';

  const globalConfig = inject('globalConfig');

  const props = defineProps({
    deviceId: {
      type: String,
      require: true,
    },
    modalType: {
      type: String,
      require: true,
    },
  });
  const renderPlayer = ref(true);
  const playerRef = ref();
  const { getCamera, removeCamera } = useCamera();
  const refresh = ref(false);
  const modalTitle = ref(''); // 模态框标题显示内容，根据设备操作类型决定
  const modalType = ref(''); // 模态框内容显示类型，设备操作类型
  const modalIsShow = ref<boolean>(false); // 是否显示模态框
  const loading = ref(true);
  let kzParam = reactive<any>({
    data: {},
    isFw: null,
  });

  // const kyjs = ['1号空压机', '1号空压机', '1号空压机', '1号空压机'];
  const flvURL1 = () => {
    // return `https://sf1-hscdn-tos.pstatp.com/obj/media-fe/xgplayer_doc_video/flv/xgplayer-demo-360p.flv`;
    return '';
  };
  const colors = ['#FDB146', '#EE6666', '#9BCB75', '#03C2EC', '#DA3914', '#9C83D9'];
  const echatsOption = {
    grid: {
      top: '35%',
      left: '15%',
      right: '20px',
      bottom: '8%',
      // containLabel: true
    },
    toolbox: {
      feature: {},
    },
  };
  const monitorNetStatus = ref(0);
  const monitorDataGroupNum = ref(0);

  let airCompressorState = reactive<any[]>([]);

  const chartsColumns = ref(getTableHeaderColumns('sys_nitrogen_chart'));

  // const propTypeArr = ref([])
  // watch(monitorDataGroupNum, () => {
  //     const arr = <any[]>[]
  //     const item = getTableHeaderColumns('sys_nitrogen_chart')
  //     const propTypeList = []
  //     for (let i = 1; i <= monitorDataGroupNum.value; i++) {
  //         const lineType = lodash.cloneDeep(item[0])
  //         lineType.legend = `制氮机${i}瞬时流量`;
  //         lineType.dataIndex = `${item[0].dataIndex}${i}`
  //         lineType.color = colors[i - 1]
  //         arr.push(lineType)
  //     }
  //     chartsColumns.value = arr
  // })

  const monitorData = ref(
    new Array(3).fill({
      // strName: '空压机',
      // cumulativeFlow: '-',
      // centerTemperature: '-',
      // outletTemperature: '-',
      // Ia: '-',
      // Ib: '-',
      // Ic: '-',
      // Vab: '-',
      // Vac: '-',
      // Vbc: '-',
      // compressGroupName: '',
      // compressExhaustPressF1: '-',
      // compressSeparatePressF1: '-',
      // compressHostTempF1: '-',
      // compressCrewTempF1: '-',
      // compressRunTimeF1: '-',
      // controlModel: 'LOC'
    })
  );

  //图表数据
  let echartData = ref<any>([]);

  // https获取监测数据
  let timer: null | NodeJS.Timeout = null;
  async function getMonitor(flag?) {
    if (Object.prototype.toString.call(timer) === '[object Null]') {
      timer = await setTimeout(
        async () => {
          if (props.deviceId) {
            await getDataSource(props.deviceId, flag);
          }
          if (timer) {
            timer = null;
          }
          await getMonitor();
        },
        flag ? 0 : 3000
      );
    }
  }

  async function getDataSource(systemID, flag?) {
    const res = await getDevice({ devicetype: 'sys', systemID, type: 'all' });
    console.log(res, 'res---------------');

    if (res) {
      const result = res;
      if (!result || result.msgTxt.length < 1) return;
      monitorData.value = [];
      result.msgTxt.forEach((item) => {
        if (item.type && item.type.startsWith('nitrogen')) {
          airCompressorState.length = 0;
          let netStatus = 0;
          const dataList: any[] = item['datalist'].filter((data) => {
            const readData = data.readData;
            if (data['netStatus'] == 1) {
              netStatus = 1;
            }
            airCompressorState.push({
              id: data.deviceID,
              deviceType: data.deviceType,
              HMIReset: readData.HMIReset,
              HMIStartStop: readData.HMIStartStop,
            });
            return Object.assign(data, readData);
          });
          monitorData.value.push(...dataList);
          monitorNetStatus.value = netStatus;
        }
      });
      const airCompressor = { readTime: monitorData.value[0]['readTime'].substring(11) };
      const dataArr = lodash.cloneDeep(echartData.value);
      //图表数据
      if (dataArr.length <= 5) {
        monitorData.value.forEach((el, index) => {
          airCompressor[`InputFlux${index + 1}`] = el['InputFlux'] || 0;
        });
        dataArr.push(airCompressor);
      } else {
        dataArr.shift();
        dataArr.push(airCompressor);
      }
      echartData.value = dataArr;
      if (flag) monitorDataGroupNum.value = monitorData.value.length;
      refresh.value = true;
      nextTick(() => {
        refresh.value = false;
      });
    }
  }

  function handlerDevice(data, bol) {
    // console.log(bol, 'bol-------')
    kzParam.data = data;
    kzParam.isFw = bol;
    // console.log(kzParam, 'kz--------')
    if (bol) {
      modalTitle.value = '一键复位';
      modalType.value = '1';
      modalIsShow.value = true;
      kzParam.data.HMIReset = !data.HMIReset;
    } else {
      modalTitle.value = '一键启停';
      modalType.value = '2';
      modalIsShow.value = true;
      kzParam.data.HMIStartStop = !data.HMIStartStop;
    }
  }
  function handleOK(passWord, handlerState) {
    // console.log(kzParam, 'kz----------');
    // if (passWord !== '123456') {
    //   message.warning('密码不正确，请重新输入');
    //   return;
    // }

    let data = {};
    if (kzParam.isFw) {
      data = {
        deviceid: kzParam.data.id,
        devicetype: kzParam.data.deviceType,
        password: passWord,
        HMIReset: kzParam.data.HMIReset,
      };
    } else {
      data = {
        deviceid: kzParam.data.id,
        password: passWord,
        devicetype: kzParam.data.deviceType,
        HMIStartStop: kzParam.data.HMIStartStop,
      };
    }

    deviceControlApi(data).then((res) => {
      // 模拟时开启
      if (res.success) {
        modalIsShow.value = false;
        getDataSource(props.deviceId);
        if (globalConfig.History_Type == 'remote') {
          message.success('指令已下发至生产管控平台成功！');
        } else {
          message.success('指令已下发成功！');
        }
      }
    });
  }
  function handleCancel() {
    modalIsShow.value = false;
    modalTitle.value = '';
    modalType.value = '';
  }
  watch(
    () => props.deviceId,
    async (deviceId) => {
      if (deviceId) {
        await getCamera(deviceId, playerRef, renderPlayer, 'nitrogen');
        getDataSource(props.deviceId, true);
      }
    }
  );
  watch([monitorDataGroupNum, loading], ([newMonitorDataGroupNum, newLoading]) => {
    nextTick(() => {
      if (newMonitorDataGroupNum && !newLoading) {
        setModelType(props.modalType, newMonitorDataGroupNum);
      }
    });
  });

  onMounted(async () => {
    await getMonitor(true);
    await mountedThree().then(() => {
      loading.value = false;
    });
  });

  onUnmounted(() => {
    destroy();
    if (timer) {
      clearTimeout(timer);
      timer = undefined;
    }
  });
</script>

<style lang="less" scoped>
  @ventSpace: zxm;

  .nitrogen-box {
    width: 100%;
    height: 100%;
    display: flex;
    justify-content: center;
  }

  #nitrogenCss3D {
    .modal-monitor {
      width: 200px;
      position: absolute;
      left: 0px;
      top: 0px;
    }

    &:deep(.win) {
      margin: 0 !important;
      background: #00000044;
    }
  }

  .nitrogen-home {
    width: 100%;
    height: 100%;
    position: fixed;
    z-index: 9999;
    display: flex;
    flex-direction: column;
    justify-content: center;
    align-items: center;
    pointer-events: none;
    top: 20px;

    .nitrogen-container {
      width: 100%;
      height: calc(100% - 100px);
      display: flex;
      justify-content: space-between;
      margin-bottom: 100px;
      .device-state {
        width: 100%;
        position: absolute;
        top: 20px;
        color: #e90000;
        display: flex;
        justify-content: center;
        font-size: 20px;
      }
      .top-box {
        width: 100%;
        padding: 10px;
        overflow: hidden;
        display: flex;
        justify-content: space-between;
        // margin-top: 40px;
        .footer-item-box {
          width: calc(100% - 20px);
          height: auto;
          position: fixed;
          bottom: 130px;
          display: flex;
          justify-content: center;
          color: #fff;
          // box-shadow: 0 0 30px rgb(0, 153, 184) inset;
          pointer-events: auto;

          .device-detail {
            text-align: center;

            &:first-child {
              background-color: #00bbff11;
            }

            &:last-child {
              .device-val,
              .device-title {
                border-right: 1px solid #00baffd4;
              }
            }

            .device-val {
              line-height: 36px;
              border-top: 1px solid #00baffd4;
              border-left: 1px solid #00baffd4;

              &:last-child {
                border-bottom: 1px solid #00baffd4;
              }
            }
          }

          .device-title {
            width: 110px;
            text-align: center;
            border-top: 1px solid #00baffd4;
            border-left: 1px solid #00baffd4;
            line-height: 36px;
            color: #00e5ff;
            background-color: #00bbff21;
            backdrop-filter: blur(5px);
            &:last-child {
              border-bottom: 1px solid #00baffd4;
            }
          }
        }
        .lr-box {
          height: 100%;
          display: flex;
          flex-direction: column;
          position: relative;
          // overflow: hidden;
          z-index: 9999;
          pointer-events: auto;
          overflow-y: auto;
          overflow-x: hidden;
          height: calc(100% - 70px);
        }

        .item {
          width: 285px;
          height: auto;
          position: relative;
          border-radius: 5px;
          margin-top: 10px;
          margin-bottom: 0px;
          pointer-events: auto;
          color: #fff;
          // overflow: hidden;

          &:first-child {
            margin-top: 0px;
          }

          .base-title {
            color: #fff;
            margin-bottom: 8px;
            padding-left: 10px;
            position: relative;
            font-size: 16px;

            &::after {
              content: '';
              position: absolute;
              display: block;
              width: 4px;
              height: 12px;
              top: 7px;
              left: 0px;
              background: #45d3fd;
              border-radius: 4px;
            }
          }
          .monitor-item {
            width: 100%;
            display: flex;
            flex-direction: row;
            flex-wrap: wrap;
            .state-item {
              width: 50%;
              padding: 5px;
              display: flex;
              align-items: center;
              justify-content: space-between;
              .state-title {
                width: 100px;
                color: #ffffffdd;
                flex: 9;
                font-size: 14px;
                .unit {
                  // color: #ffffffbb;
                }
              }
              .state-val {
                flex: 1;
                color: #e4a300;
                margin-right: 5px;
                text-align: right;
                font-size: 14px;
              }
            }
          }

          .signal-box {
            margin: 5px 0;
            display: flex;
            align-items: center;

            .signal-title {
              color: #7af5ff;
              margin: 0 5px;
            }

            &:last-child {
              margin-right: 0px;
            }
          }

          .list-item {
            padding: 0 10px;
            display: flex;
            justify-content: space-between;
            align-items: center;

            .item-data-key {
              color: #ffffff99;
            }
          }

          .item-data-box {
            color: #fff;

            .state-icon {
              display: inline-block;
              width: 12px;
              height: 12px;
              border-radius: 12px;
            }

            .open {
              border: 5px solid #133a56;
              background: #4ecb73;
            }

            .close {
              border: 5px solid #192961;
              background: #6d7898;
            }
          }
        }

        .item-l {
          width: 100%;

          .monitor-box {
            width: 100%;

            .parameter-title {
              position: relative;
              width: 100%;
              height: 14px;
              margin-top: 10px;

              .icon,
              span {
                position: absolute;
                top: -10px;
              }
            }

            .group-parameter-title {
              background-image: linear-gradient(to right, #39a3ff50, #39a3ff00);

              .icon {
                left: -12px;
                top: -17px;
              }

              span {
                left: 18px;
              }

              .item-col {
                background-image: linear-gradient(to right, #39a3ff00, #39a3ff10);
              }
            }

            .device-parameter-title {
              background-image: linear-gradient(to right, #3df6ff40, #3df6ff00);

              .icon {
                left: -10px;
                top: -14px;
              }

              span {
                left: 18px;
              }

              .item-col {
                background-image: linear-gradient(to right, #3df6ff10, #3df6ff00);
              }
            }
          }
        }

        .right-box {
          width: 330px;
          margin-top: 50px;

          .control-group {
            display: flex;
            // justify-content: space-around;
            flex-wrap: wrap;

            .control-item {
              width: 50%; //lxh
              display: flex;
              flex-direction: column;
              justify-content: center;
              align-items: center;
              padding: 0 4px;

              .control-item-title {
                color: #a6dce9;
                position: relative;
                top: 5px;
              }

              .control-item-state {
                width: 94px;
                height: 47px;
                background: url('/@/assets/images/vent/control-switch-bg.png');
                display: flex;
                justify-content: center;
                align-items: center;
                color: #fff;
              }

              .button-box {
                position: relative;
                padding: 5px;
                border: 1px transparent solid;
                background-clip: border-box;
                border-radius: 5px;
                margin-left: 8px;
              }

              .a-button {
                pointer-events: auto;
              }

              &::v-deep .a-button--mini {
                padding: 6px 10px;
              }

              &::v-deep .a-button--mini.is-round {
                padding: 6px 10px;
              }
            }
          }
        }

        .left-box {
          width: 335px;
          margin-top: 80px;
        }
      }

      &:deep(.win) {
        width: 100%;
        margin: 0 !important;
      }
    }
  }

  &:deep(.main) {
    .title {
      height: 34px;
      text-align: center;
      font-weight: 600;
      color: #7af5ff;
      // background-image: url('../../../assets/img/yfj/light.png');
      background-repeat: no-repeat;
      background-position-x: center;
      background-position-y: 100%;
      background-size: 80%;
      font-size: 16px;
    }

    .monitor-item {
      width: 200px;
      display: flex;
      flex-direction: row;
      width: auto;
      margin-bottom: 3px;

      .monitor-val {
        color: #ffb700;
        display: flex;
        width: auto;

        .val {
          width: 80px;
          font-size: 14px;
        }

        .unit {
          color: #ffffffbb;
          font-size: 14px;
        }
      }
    }

    .monitor-title {
      width: 100px;
      color: #7af5ff;
      font-weight: 400;
      font-size: 14px;
    }

    .signal-item {
      display: flex;
      justify-content: space-between;

      // margin-bottom: 5px;
      .signal-round {
        display: inline-block;
        width: 8px;
        height: 8px;
        border-radius: 50%;
        margin: 0 10px;
        position: relative;

        &::after {
          display: block;
          content: '';
          position: absolute;
          width: 12px;
          height: 12px;
          top: -2px;
          left: -2px;
          border-radius: 50%;
        }
      }

      .signal-round-gry {
        background-color: #858585;

        &::after {
          background-color: #85858544;
          box-shadow: 0 0 1px 1px #85858599;
        }
      }

      .signal-round-run {
        background-color: #67fc00;

        &::after {
          background-color: #67fc0044;
          box-shadow: 0 0 1px 1px #c6ff77;
        }
      }

      .signal-round-warning {
        background-color: #e9170b;

        &::after {
          background-color: #e9170b44;
          box-shadow: 0 0 1px 1px #e9170b;
        }
      }
    }
  }

  :deep(.zxm-radio-wrapper) {
    color: #fff !important;
  }
</style>
